Утвержден приказом Федеральной службы по экологическому, технологическому и атомному надзору от 4 февраля 2022 г. № 33.

Перечень нормативных правовых актов и нормативных документов, относящихся к сфере деятельности Федеральной службы по экологическому, технологическому и атомному надзору

Раздел II.Государственное регулирование безопасности при использовании атомной энергии.
Перечень П‑01‑01‑2021

Оглавление

Введение

Раздел II Перечня нормативных правовых актов и нормативных документов, относящихся к сфере деятельности Федеральной службы по экологическому, технологическому и атомному надзору, содержит сведения о нормативных правовых актах и нормативных документах по вопросам, отнесенным к компетенции Федеральной службы по экологическому, технологическому и атомному надзору в сфере безопасности при использовании атомной энергии (далее — Перечень П-01-01-2021).

Перечень П-01-01-2021 представляет собой справочный сборник, предназначенный для информирования работников Ростехнадзора, других федеральных органов исполнительной власти, юридических лиц, индивидуальных предпринимателей и граждан о нормативных правовых актах и нормативных документах, используемых для регулирования деятельности при использовании атомной энергии.

В соответствии с установленным порядком Перечень П-01-01-2021 разрабатывается и утверждается отдельно от Раздела I «Технологический, строительный, энергетический надзор» Перечня нормативных правовых актов и нормативных документов, относящихся к сфере деятельности Федеральной службы по экологическому, технологическому и атомному надзору.

Перечень П-01-01-2021 составлен с учетом приложения № 3 приказа Ростехнадзора от 17 октября 2016 г. № 421 «Об утверждении перечней правовых актов, содержащих обязательные требования, соблюдение которых оценивается при проведении мероприятий по контролю в рамках осуществления видов государственного контроля (надзора), отнесенных к компетенции Федеральной службы по экологическому, технологическому и атомному надзору» и документов, имеющих рекомендательный характер.

Перечень П-01-01-2021 состоит из трех глав.

В разделах 1–6 главы I приведен перечень законодательных и нормативных правовых актов:

международные договоры Российской Федерации;

федеральные законы Российской Федерации;

указы Президента Российской Федерации;

постановления и распоряжения Правительства Российской Федерации;

технические регламенты;

административные регламенты и соглашения о взаимодействии.

В разделах 1–12 главы II приведен перечень нормативных правовых и нормативных документов Ростехнадзора:

в разделе 1 «Общие документы» приведен перечень федеральных норм и правил в области использования атомной энергии и руководств по безопасности при использовании атомной энергии, имеющих область распространения на три и более вида объекта использования атомной энергии или деятельности в области использования атомной энергии;

в разделах 2–10 приведены перечни федеральных норм и правил в области использования атомной энергии и руководств по безопасности при использовании атомной энергии, относящихся к определенному виду объекта использования атомной энергии или виду деятельности в области использования атомной энергии;

в разделах 11 и 12 приведены перечни организационно-распорядительных документов — приказов и руководящих документов, используемых Ростехнадзором для реализации своих полномочий при регулировании безопасности в области использования атомной энергии.

В приложении приведены нормативные документы, утвержденные другими федеральными органами исполнительной власти:

в разделе 1 приведены перечни нормативных документов других органов государственного регулирования безопасности;

в разделе 2 приведен перечень нормативных документов, утвержденных другими федеральными органами исполнительной власти Российской Федерации, органами государственного управления использованием атомной энергии или организациями.

В связи с регулярными изменениями, происходящими в законодательстве Российской Федерации, при применении документов, перечисленных в Перечне П-01-01-2021, следует учитывать следующее:

в соответствии с частью 5 статьи 3 части первой Гражданского кодекса Российской Федерации в случае противоречия указа Президента Российской Федерации или постановления Правительства Российской Федерации закону применяется соответствующий закон;

в соответствии с пунктом 10 Указа Президента Российской Федерации от 23 мая 1996 г. № 763 «О порядке опубликования и вступления в силу актов Президента Российской Федерации, Правительства Российской Федерации и нормативных правовых актов федеральных органов исполнительной власти» нормативные правовые акты федеральных органов исполнительной власти, кроме актов и отдельных их положений, содержащих сведения, составляющие государственную тайну, или сведения конфиденциального характера, не прошедшие государственную регистрацию, а также зарегистрированные, но не опубликованные в установленном порядке, не влекут правовых последствий, как не вступившие в силу, и не могут служить основанием для регулирования соответствующих правоотношений, применения санкций к гражданам, должностным лицам и организациям за невыполнение содержащихся в них предписаний; на указанные акты нельзя ссылаться при разрешении споров.

Работники Ростехнадзора при исполнении ими должностных обязанностей в пределах предоставленных им полномочий могут использовать другие действующие нормативные правовые акты федеральных органов исполнительной власти в части, не противоречащей действующим законодательным и иным нормативным правовым актам.

Все документы Перечня П-01-01-2021 должны использоваться в редакциях, действующих на момент их применения.

 I. Законодательные и нормативные правовые акты в области использования атомной энергии
1. Основные международные договоры Российской Федерации
№ п/п | Наименование документа | Год подписания, год ратификации
1. | Приложения А и В Европейского соглашения о международной дорожной перевозке опасных грузов (ДОПОГ) | 1957 г.
2. | Международная конвенция по охране человеческой жизни на море | 1960 г., 1965 г.
3. | Конвенция об ответственности операторов ядерных судов | Не подписана и не ратифицирована
4. | Конвенция об оперативном оповещении о ядерной аварии | 1986 г., 1987 г.
5. | Конвенция о помощи в случае ядерной или радиационной аварийной ситуации | 1986 г., 1986 г.
6. | Конвенция о физической защите ядерного материала и ядерных установок | 1979 г., 1983 г.
7. | Конвенция об оценке воздействия на окружающую среду в трансграничном пространстве | 1991 г., не ратифицирована
8. | Конвенция о ядерной безопасности | 1994 г., 1996 г.
9. | Венская конвенция о гражданской ответственности за ядерный ущерб | 1997 г., 2005 г.
10. | Объединенная конвенция о безопасности обращения с отработавшим топливом и о безопасности обращения с радиоактивными отходами | 1999 г., 2005 г.
11. | Международная конвенция о борьбе с актами ядерного терроризма | 2005 г., 2006 г.

2. Федеральные законы Российской Федерации
№ п/п | Наименование закона | Дата подписания закона и его регистрационный номер
1. | Гражданский кодекс Российской Федерации (часть первая) | 30 ноября 1994 г. № 51-ФЗ
2. | Гражданский кодекс Российской Федерации (часть вторая) | 26 января 1996 г. № 14-ФЗ
3. | Гражданский кодекс Российской Федерации (часть третья) | 26 ноября 2001 г. № 146-ФЗ
4. | Гражданский кодекс Российской Федерации (часть четвертая) | 18 декабря 2006 г. № 230-ФЗ
5. | Уголовный кодекс Российской Федерации | 13 июня 1996 г. № 63-ФЗ
6. | Кодекс Российской Федерации об административных правонарушениях | 30 декабря 2001 г. № 195-ФЗ
7. | «О введении в действие Кодекса Российской Федерации об административных правонарушениях» | 30 декабря 2001 г. № 196-ФЗ
8. | Градостроительный кодекс Российской Федерации | 29 декабря 2004 г. № 190-ФЗ
9. | «О введении в действие Водного кодекса Российской Федерации» | 3 июня 2006 г. № 73-ФЗ
10. | Водный кодекс Российской Федерации | 3 июня 2006 г. № 74-ФЗ
11. | «О недрах» | 21 февраля 1992 г. № 2395-1
12. | «О государственной тайне» | 21 июля 1993 г. № 5485-1
13. | «О защите населения и территорий от чрезвычайных ситуаций природного и техногенного характера» | 21 декабря 1994 г. № 68-ФЗ
14. | «О пожарной безопасности» | 21 декабря 1994 г. № 69-ФЗ
15. | «Об использовании атомной энергии» | 21 ноября 1995 г. № 170-ФЗ
16. | «Об экологической экспертизе» | 23 ноября 1995 г. № 174-ФЗ
17. | «О радиационной безопасности населения» | 9 января 1996 г. № 3-ФЗ
18. | «О финансировании особо радиационно опасных и ядерно опасных производств и объектов» | 3 апреля 1996 г. № 29-ФЗ
19. | «О промышленной безопасности опасных производственных объектов» | 21 июля 1997 г. № 116-ФЗ
20. | «О безопасности гидротехнических сооружений» | 21 июля 1997 г. № 117-ФЗ
21. | «О санитарно-эпидемиологическом благополучии населения» | 30 марта 1999 г. № 52-ФЗ
22. | «О ведомственной охране» | 14 апреля 1999 г. № 77-ФЗ
23. | «Об охране атмосферного воздуха» | 4 мая 1999 г. № 96-ФЗ
24. | «О специальных экологических программах реабилитации радиационно загрязненных участков территории» | 10 июля 2001 г. № 92-ФЗ
25. | «Об охране окружающей среды» | 10 января 2002 г. № 7-ФЗ
26. | «О техническом регулировании» | 27 декабря 2002 г.  № 184-ФЗ
27. | «Об электроэнергетике» | 26 марта 2003 г. № 35-ФЗ
28. | «О противодействии терроризму» | 6 марта 2006 г. № 35-ФЗ
29. | «Об особенностях управления и распоряжения имуществом и акциями организаций, осуществляющих деятельность в области использования атомной энергии, и о внесении изменений в отдельные законодательные акты Российской Федерации» | 5 февраля 2007 г. № 13-ФЗ
30. | «О Государственной корпорации по атомной энергии «Росатом» | 1 декабря 2007 г. № 317-ФЗ
31. | «О саморегулируемых организациях» | 1 декабря 2007 г. № 315-ФЗ
32. | «Об обеспечении единства измерений» | 26 июня 2008 г. № 102-ФЗ
33. | «О защите прав юридических лиц и индивидуальных предпринимателей при осуществлении государственного контроля (надзора) и муниципального контроля» | 26 декабря 2008 г. № 294-ФЗ
34. | «Об организации предоставления государственных и муниципальных услуг» | 27 июля 2010 г. № 210-ФЗ
35. | «О полиции» | 7 февраля 2011 г. № 3-ФЗ
36. | «Устав о дисциплине работников организаций, эксплуатирующих особо радиационно опасные и ядерно опасные производства и объекты в области использования атомной энергии» | 8 марта 2011 г. № 35-ФЗ
37. | «О лицензировании отдельных видов деятельности» | 4 мая 2011 г. № 99-ФЗ
38. | «Об обращении с радиоактивными отходами и о внесении изменений в отдельные законодательные акты Российской Федерации» | 11 июля 2011 г. № 190-ФЗ
39. | «О внесении изменений в отдельные законодательные акты Российской Федерации по вопросам осуществления государственного контроля (надзора) и муниципального контроля» | 18 июля 2011 г. № 242-ФЗ
40. | «О порядке осуществления иностранных инвестиций в хозяйственные общества, имеющие стратегическое значение для обеспечения обороны страны и безопасности государства» | 29 апреля 2008 г. № 57-ФЗ
41. | «О стандартизации в Российской Федерации» | 29 июня 2015 г. № 162-ФЗ
42. | «О внесении изменений в Постановление Верховного Совета Российской Федерации «О распространении действия Закона РСФСР «О социальной защите граждан, подвергшихся воздействию радиации вследствие катастрофы на Чернобыльской АЭС» на граждан из подразделений особого риска» | 29 июня 2015 г. № 169-ФЗ
43. | «О войсках национальной гвардии Российской Федерации» | 3 июля 2016 г. № 226-ФЗ
44. | «Об обязательных требованиях в Российской Федерации» | 31 июля 2020 г. № 247-ФЗ
45. | «О государственном контроле (надзоре) и муниципальном контроле в Российской Федерации» | 31 июля 2020 г. № 248-ФЗ

3. Указы Президента Российской Федерации
№ п/п | Наименование указа | Дата подписания указа, его регистрационный номер
1. | «О контроле за экспортом из Российской Федерации ядерных материалов, оборудования, технологий» | 27 марта 1992 г. № 312
2. | «Об эксплуатирующей организации атомных станций Российской Федерации» | 7 сентября 1992 г. № 1055
3. | «О выполнении Российской Федерацией межправительственных соглашений о сотрудничестве в сооружении атомных электростанций за рубежом» | 21 апреля 1993 г. № 472
4. | «О государственной поддержке структурной перестройки и конверсии атомной промышленности в г. Железногорске Красноярского края» | 25 января 1995 г. № 72
5. | «О дополнительных мерах по усилению контроля за выполнением требований экологической безопасности при переработке отработавшего ядерного топлива» | 20 апреля 1995 г. № 389
6. | «О совершенствовании управления предприятиями ядерно-топливного цикла» | 8 февраля 1996 г. № 166
7. | «Об утверждении Списка ядерных материалов, оборудования, специальных неядерных материалов и соответствующих технологий, подпадающих под экспортный контроль» | 14 февраля 1996 г. № 202
8. | «О порядке опубликования и вступления в силу актов Президента Российской Федерации, Правительства Российской Федерации и нормативных правовых актов федеральных органов исполнительной власти» | 23 мая 1996 г. № 763
9. | «О гарантиях безопасного и устойчивого функционирования атомной энергетики Российской Федерации» | 2 июля 1996 г. № 1012
10. | «Вопросы федеральных органов исполнительной власти» | 6 сентября 1996 г. № 1326
11. | «Об утверждении Положения о государственной системе противодействия ядерному терроризму» | 27 февраля 2015 г. № 104с
12. | «О специальной комиссии по вопросам ввоза на территорию Российской Федерации облученных тепловыделяющих сборок зарубежного производства» | 10 июля 2001 г. № 828
13. | «О совершенствовании государственного управления в области пожарной безопасности» | 9 ноября 2001 г. № 1309
14. | «Об утверждении положения о специальной комиссии по вопросам ввоза на территорию Российской Федерации облученных тепловыделяющих сборок зарубежного производства и ее состава» | 31 июля 2003 г. № 858
15. | «Об утверждении списка оборудования и материалов двойного назначения и соответствующих технологий, применяемых в ядерных целях, в отношении которых осуществляется экспортный контроль» | 14 января 2003 г. № 36
16. | «О мерах по противодействию терроризму» | 15 февраля 2006 г. № 116
17. | «О реструктуризации атомного энергопромышленного комплекса Российской Федерации» | 27 апреля 2007 г. № 556
18. |  «Об организации федерального государственного надзора в области ядерной и радиационной безопасности ядерного оружия и ядерных энергетических установок военного назначения и в области физической защиты ядерных материалов, ядерных установок и пунктов хранения ядерных материалов на ядерных объектах» | 13 февраля 2014 г. № 79
19. |  «Вопросы Федеральной службы войск национальной гвардии Российской Федерации» | 5 апреля 2016 г. № 157

 4. Постановления и распоряжения Правительства Российской Федерации
№ п/п | Наименование постановления, распоряжения | Дата подписания постановления, распоряжения и его регистрационный номер
1. | «Об утверждении Порядка инвентаризации мест и объектов добычи, транспортировки, переработки, использования, сбора, хранения и захоронения радиоактивных веществ и источников ионизирующих излучений на территории Российской Федерации» | 22 июля 1992 г. № 505
2. | «О мерах по комплексному решению проблемы обращения с радиоактивными отходами и прекращении захоронения их в морях» | 23 июля 1993 г. № 710
3. | «Об утверждении Положения о государственной экологической экспертизе» | 22 сентября 1993г. № 942
4. | «О мерах по выполнению Указа Президента Российской Федерации от 8 февраля 1996 г. № 166 «О совершенствовании управления предприятиями ядерно-топливного цикла»» | 11 июня 1996 г. № 677
5. | «Об утверждении Положения о проведении государственной экологической экспертизы» | 7 ноября 2020 г. № 1796
6. | «О Порядке разработки радиационно-гигиенических паспортов организаций и территорий» | 28 января 1997 г. № 93
7. | «Об утверждении Перечня должностей работников объектов использования атомной энергии, которые должны получать разрешения Федеральной службы по экологическому, технологическому и атомному надзору на право ведения работ в области использования атомной энергии» | 3 марта 1997 г. № 240

8.

«Об определении территорий, прилегающих к особо радиационно опасным и ядерно опасным производствам и объектам, и о формировании и использовании централизованных средств на финансирование мероприятий по социальной защите населения, проживающего на указанных территориях, а также на финансирование развития социальной инфраструктуры этих территорий в соответствии с Федеральным законом «О финансировании особо радиационно опасных и ядерно опасных производств и объектов»»

12 марта 1997 г. № 289

9. | «О Правилах принятия решений о размещении и сооружении ядерных установок, радиационных источников и пунктов хранения» | 14 марта 1997 г. № 306
10. | «Об утверждении Правил подготовки нормативных правовых актов федеральных органов исполнительной власти и их государственной регистрации» | 13 августа 1997 г. № 1009
11. | «Об утверждении Положения о разработке и утверждении федеральных норм и правил в области использования атомной энергии» | 1 декабря 1997 г. № 1511
12. | «О государственном органе, специально уполномоченном заключать договоры на передачу находящихся в федеральной собственности ядерных материалов в пользование юридическим лицам» | 15 сентября 1998г. № 1117
13. | «О декларировании безопасности гидротехнических сооружений» | 20 ноября 2020 г. № 1892
14. | «Об организации ведомственной охраны» | 12 июля 2000 г. № 514
15. | «Об утверждении Положения о государственной санитарно-эпидемиологической службе Российской Федерации и Положения о государственном санитарно-эпидемиологическом нормировании» | 24 июля 2000 г. № 554
16. | «Об экспорте и импорте ядерных материалов, оборудования, специальных неядерных материалов и соответствующих технологий» | 15 декабря 2000 г. № 973
17. | «О государственном компетентном органе по ядерной и радиационной безопасности при перевозках ядерных материалов, радиоактивных веществ и изделий из них» | 19 марта 2001 г. № 204
18. | «Об утверждении Положения об осуществлении контроля за внешнеэкономической деятельностью в отношении оборудования и материалов двойного назначения, а также соответствующих технологий, применяемых в ядерных целях» | 14 июня 2001 г. № 462

19.

«Об утверждении правил отчисления предприятиями и организациями, эксплуатирующими особо радиационно опасные и ядерно опасные производства и объекты (атомные станции), средств для формирования резервов, предназначенных для обеспечения безопасности атомных станций на всех стадиях их жизненного цикла и развития»

30 января 2002 г. № 68

20. | «О порядке ввоза в Российскую Федерацию облученных тепловыделяющих сборок ядерных реакторов» | 11 июля 2003 г. № 418
21. | «О Федеральной службе по экологическому, технологическому и атомному надзору» | 30 июля 2004 г. № 401
22. | «Об утверждении Положения о рассмотрении заявок на получение права пользования недрами для целей захоронения радиоактивных отходов и отходов I–V классов опасности в глубоких горизонтах, обеспечивающих локализацию таких отходов». | 22 декабря 2004 г. № 827
23. | «Об определении источников возмещения расходов на обеспечение деятельности и выполнение обязанностей эксплуатирующей организации, осуществляющей деятельность в области использования атомной энергии» | 16 февраля 2005 г. № 81

24.

«Об утверждении правил отчисления организациями, эксплуатирующими особо радиационно опасные и ядерно опасные производства и объекты (кроме атомных станций), средств для формирования резервов, предназначенных для обеспечения безопасности указанных производств и объектов на всех стадиях их жизненного цикла и развития»

21 сентября 2005 г. № 576

25. | «Об утверждении Положения о федеральном государственном строительном надзоре» | 30 июня 2021 г. № 1087
26. | «О федеральных органах исполнительной власти и уполномоченных организациях, осуществляющих государственное управление использованием атомной энергии и государственное регулирование безопасности при использовании атомной энергии» | 3 июля 2006 г. № 412
27. | «Об инженерных изысканиях для подготовки проектной документации, строительства, реконструкции объектов капитального строительства» | 19 января 2006 г. № 20
28. | «О порядке организации и проведения государственной экспертизы проектной документации и результатах инженерных изысканий» | 5 марта 2007 г. № 145
29. | «Об утверждении Правил физической защиты ядерных материалов, ядерных установок и пунктов хранения ядерных материалов» | 19 июля 2007 г. № 456
30. | «О составе разделов проектной документации и требованиях к их содержанию» | 16 февраля 2008 г. № 87
31. | «О компетенции федеральных органов исполнительной власти, руководство деятельностью которых осуществляет Правительство Российской Федерации, в области противодействия терроризму» | 4 мая 2008 г. № 333
32. | «Об утверждении Положения о системе государственного учета и контроля ядерных материалов» | 6 мая 2008 г. № 352
33. | «Об утверждении регламента Государственной корпорации по атомной энергии «Росатом» | 26 ноября 2008 г. № 888
34. | «О перечне организаций, эксплуатирующих особо радиационно опасные и ядерно опасные производства и объекты» | 14 сентября 2009 г. № 1311-р
35. | «О компетентном органе и пункте связи, предусмотренных Конвенцией об оперативном оповещении о ядерной аварии и Конвенцией о помощи в случае ядерной аварии или радиационной аварийной ситуации» | 23 ноября 2009 г. № 949
36. | «Об утверждении Положения о ведомственной охране Государственной корпорации по атомной энергии «Росатом» и о признании утратившими силу некоторых актов Правительства Российской Федерации» | 12 октября 2017 г. № 1240
37. | «О федеральном государственном бюджетном учреждении «Национальный исследовательский центр «Курчатовский институт» | 13 ноября 2010 г. № 912

38.

«Об утверждении Положения о признании организации пригодной эксплуатировать ядерную установку, радиационный источник или пункт хранения и осуществлять собственными силами или с привлечением других организаций деятельность по размещению, проектированию, сооружению, эксплуатации и выводу из эксплуатации ядерной установки, радиационного источника или пункта хранения, а также деятельность по обращению с ядерными материалами и радиоактивными веществами»

17 февраля 2011 г. № 88

39. | «Об утверждении минимальных требований к членам саморегулируемой организации, выполняющим инженерные изыскания, осуществляющим подготовку проектной документации, строительство, реконструкцию, капитальный ремонт особо опасных, технически сложных и уникальных объектов» | 11 мая 2017 г. № 559
40. | «Об утверждении Правил перевозок грузов автомобильным транспортом и о внесении изменений в пункт 2.1.1 Правил дорожного движения Российской Федерации» | 21 декабря 2020 г. № 2200

41.

«О перечне эксплуатирующих организаций, на которые распространяется действие Федерального закона «Устав о дисциплине работников организаций, эксплуатирующих особо радиационно и ядерно опасные производства и объекты в области использования атомной энергии», об изменении и признании утратившими силу некоторых актов Правительства Российской Федерации»

20 июля 2011 г. № 597

42. | «Об определении национального оператора по обращению с радиоактивными отходами» | 20 марта 2012 г. № 384-р
43. | «Об утверждении Положения о режиме постоянного государственного надзора на объектах использования атомной энергии» | 23 апреля 2012 г. № 373
44. | «Об утверждении перечня объектов использования атомной энергии, в отношении которых вводится режим постоянного государственного надзора» | 23 апреля 2012 г. № 610-р
45. |  «Об утверждении Правил противопожарного режима в Российской Федерации» | 16 сентября 2020 г. № 1479
46. | «О проведении первичной регистрации радиоактивных отходов» | 25 июля 2012 г. № 767
47. | «О порядке раскрытия федеральными органами исполнительной власти информации о подготовке проектов нормативных правовых актов и результатах их общественного обсуждения» | 25 августа 2012 г. № 851

48.

«Об утверждении Положения о передаче радиоактивных отходов на захоронение, в том числе радиоактивных отходов, образовавшихся при осуществлении деятельности, связанной с разработкой, изготовлением, испытанием, эксплуатацией и утилизацией ядерного оружия и ядерных энергетических установок военного назначения»

10 сентября 2012 г. № 899

49. | «О федеральном государственном надзоре в области использования атомной энергии» | 15 октября 2012 г.  № 1044
50. | «О критериях отнесения твердых, жидких и газообразных отходов к радиоактивным отходам, критериях отнесения к особым радиоактивным отходам и к удаляемым радиоактивным отходам и критериях классификации удаляемых радиоактивных отходов» | 19 октября 2012 г. № 1069
51. | «О регистрации организаций, осуществляющих деятельность по эксплуатации радиационных источников, содержащих в своем составе только радионуклидные источники четвертой и пятой категорий радиационной опасности» | 19 ноября 2012 г. № 1184
52. | «Об определении порядка и сроков создания единой государственной системы обращения с радиоактивными отходами» | 19 ноября 2012 г. № 1185
53. | «Об утверждении Положения о возврате в Российскую Федерацию отработавшего закрытого источника ионизирующего излучения, произведенного в Российской Федерации, и возврате отработавшего закрытого источника ионизирующего излучения в страну поставщика закрытого источника ионизирующего излучения» | 19 ноября 2012 г. № 1186

54.

«Об утверждении Правил отчисления национальным оператором по обращению с радиоактивными отходами части поступающих при приеме радиоактивных отходов от организаций, не относящихся к организациям, эксплуатирующим особо радиационно опасные и ядерно опасные производства и объекты, средств в фонд финансирования расходов на захоронение радиоактивных отходов»

19 ноября 2012 г. № 1187

55. | «О порядке государственного регулирования тарифов на захоронение радиоактивных отходов» | 3 декабря 2012 г. № 1249
56. | «О федеральных нормах и правилах в области использования атомной энергии» | 6 декабря 2012 г. № 1265
57. | «Об утверждении Положения об особенностях обеспечения единства измерений при осуществлении деятельности в области использования атомной энергии» | 30 декабря 2012 г. № 1488
58. | «Об утверждении Положения об отнесении объектов использования атомной энергии к отдельным категориям и определении состава и границ таких объектов» | 30 декабря 2012 г. № 1494
59. | «О лицензировании деятельности в области использования атомной энергии» | 29 марта 2013 г. № 280

60.

«Об особенностях технического регулирования в части разработки и установления государственными заказчиками, федеральными органами исполнительной власти, уполномоченными в области государственного управления использованием атомной энергии и государственного регулирования безопасности при использовании атомной энергии, и Государственной корпорацией по атомной энергии «Росатом» обязательных требований в отношении продукции, для которой устанавливаются требования, связанные с обеспечением безопасности в области использования атомной энергии, а также процессов проектирования (включая изыскания), производства, строительства, монтажа, наладки, эксплуатации, хранения, перевозки, реализации, утилизации и захоронения указанной продукции»

23 апреля 2013 г. № 362

61. | «Об утверждении положения об отнесении юридического лица к организации научно-технической поддержки уполномоченного органа государственного регулирования безопасности при использовании атомной энергии» | 30 апреля 2013 г. № 387
62. | «Об антитеррористической защищенности объектов (территорий)» | 25 декабря 2013 г. № 1244
63. | «О сотрудничестве по вопросам развития национальных систем регулирования ядерной и радиационной безопасности при использовании атомной энергии в мирных целях в государствах, являющихся заказчиками сооружения по российским проектам объектов использования атомной энергии» | 15 апреля 2014 г. № 339
64. | «О государственном мониторинге радиационной обстановки на территории Российской Федерации» | 10 июля 2014 г. № 639
65. | «Об антитеррористической защищенности объектов (территорий) Государственной корпорации по атомной энергии «Росатом» | 29 августа 2014 г. № 876
66. | «Об утверждении требований к антитеррористической защищенности мест массового пребывания людей и объектов (территорий), подлежащих обязательной охране полицией, и форм паспортов безопасности таких мест и объектов (территорий)» | 25 марта 2015 г. № 272
67. | «Об утверждении критериев отнесения объектов, оказывающих негативное воздействие на окружающую среду, к объектам I, II, III и IV категорий» | 31 декабря 2020 г. № 2398
68. | «О полномочиях федеральных органов исполнительной власти, руководство деятельностью которых осуществляет Правительство Российской Федерации, в области противодействия ядерному терроризму» | 8 октября 2015 г.  № 1077-62

69.

«Об утверждении перечня организаций, в результате осуществления деятельности которых по добыче и переработке урановых руд образуются радиоактивные отходы, и организаций, эксплуатирующих особо радиационно опасные и ядерно опасные производства и объекты и осуществляющих деятельность, в результате которой образуются очень низкоактивные радиоактивные отходы, которые могут осуществлять захоронение указанных отходов в пунктах захоронения радиоактивных отходов, размещенных на земельных участках, используемых такими организациями»

7 декабря 2015 г. № 2499-р

70. | «Об утверждении требований антитеррористической защищенности объектов (территорий) Федеральной службы по экологическому, технологическому и атомному надзору и формы паспорта безопасности этих объектов (территорий)» | 19 апреля 2016 г. № 325
71. | «О порядке организации системы государственного учета и контроля радиоактивных веществ и радиоактивных отходов» | 15 июня 2016 г. № 542

72.

«Об особенностях оценки соответствия продукции, для которой устанавливаются требования, связанные с обеспечением безопасности в области использования атомной энергии, а также процессов ее проектирования (включая изыскания), производства, строительства, монтажа, наладки, эксплуатации, хранения, перевозки, реализации, утилизации и захоронения»

15 июня 2016 г. № 544

73. | «Об утверждении положения о стандартизации в отношении продукции (работ, услуг), для которой устанавливаются требования, связанные с обеспечением безопасности в области использования атомной энергии, а также процессов и иных объектов стандартизации, связанных с такой продукцией» | 12 июля 2016 г. № 669
74. | «О применении риск-ориентированного подхода при организации отдельных видов государственного контроля (надзора) и внесении изменений в некоторые акты Правительства Российской Федерации» | 17 августа 2016 г. № 806
75. | «Об утверждении требований к оборудованию инженерно-технических средств охраны важных государственных объектов, специализированных грузов, сооружений на коммуникациях, подлежащих охране войсками национальной гвардии Российской Федерации» | 27 мая 2017 г. № 646
76. | «О нормативах допустимых выбросов радиоактивных веществ и нормативах допустимых сбросов радиоактивных веществ, а также о выдаче разрешений на выбросы радиоактивных веществ, разрешений на сбросы радиоактивных веществ» | 26 июня 2018 г. № 731
77. | «Об утверждении единого перечня продукции, подлежащей обязательной сертификации, и единого перечня продукции, подтверждение соответствия которой осуществляется в форме принятия декларации о соответствии» | 1 декабря 2009 г. № 982
78. | «Об утверждении Правил разработки и утверждения методик расчета выбросов вредных (загрязняющих) веществ в атмосферный воздух стационарными источниками» | 16 мая 2016 г. № 422
79. | «Об утверждении перечня загрязняющих веществ, в отношении которых применяются меры государственного регулирования в области охраны окружающей среды» | 8 июля 2015 г. № 1316-р
80. | «Об утверждении перечней пунктов захоронения радиоактивных отходов, пунктов размещения особых радиоактивных отходов, пунктов консервации особых радиоактивных отходов». | 17 февраля 2016 г. № 1316-р

81.

«Об утверждении перечня нормативных правовых актов и групп нормативных правовых актов Правительства Российской Федерации, нормативных правовых актов, отдельных положений нормативных правовых актов и групп нормативных правовых актов федеральных органов исполнительной власти, правовых актов, отдельных положений правовых актов, групп правовых актов исполнительных и распорядительных органов государственной власти РСФСР и Союза ССР, решений Государственной комиссии по радиочастотам, содержащих обязательные требования, в отношении которых не применяются положения частей 1, 2 и 3 статьи 15 Федерального закона "Об обязательных требованиях в Российской Федерации"

31 декабря 2020 г. № 2467

82. |  «Вопросы частной детективной (сыскной) и частной охранной деятельности»; | 14 августа 1992 г. № 587

 5. Технические регламенты
№ п/п | Наименование регламента | Акт, вводящий в действие регламент, дата подписания и номер
1. | Технический регламент Таможенного союза «О безопасности машин и оборудования» (ТР ТС 010/2011) | Решение Комиссии Таможенного союза от 18 октября 2011 г. № 823
2. | «Технический регламент о требованиях пожарной безопасности» | Федеральный закон от 22 июля 2008 г. № 123-ФЗ
3. | «Технический регламент о безопасности зданий и сооружений» | Федеральный закон от 30 декабря 2009 г. № 384-ФЗ
4. | «Технический регламент Евразийского экономического союза «О требованиях к средствам обеспечения пожарной безопасности и пожаротушения» (ТР ЕАЭС 043/2017) | Решение Совета Евразийской Экономической комиссии от 23 июня 2017 г. № 40

6. Регламент. Административные регламенты. Соглашения о взаимодействии
Регламент. Административные регламенты
№ п/п | Наименование документа | Акт, вводящий в действие регламент, дата подписания и номер, дата и номер соглашения
1. | Регламент Федеральной службы по экологическому, технологическому и атомному надзору | Приказ Ростехнадзора от 1 июня 2011 г. № 271. Зарегистрирован Минюстом России 7 июля 2011 г. № 21281

2.

Административный регламент по исполнению Федеральной службой по экологическому, технологическому и атомному надзору государственной функции по осуществлению контроля и надзора за физической защитой ядерных установок, радиационных источников, пунктов хранения, ядерных материалов и радиоактивных веществ, за системами единого государственного учета и контроля ядерных материалов, радиоактивных веществ, радиоактивных отходов

Приказ Ростехнадзора от 15 декабря 2011 г. № 703. Зарегистрирован Минюстом России 16 апреля 2012 г. № 23845

3. | Административный регламент по предоставлению Федеральной службой по экологическому, технологическому и атомному надзору государственной услуги по выдаче разрешений на право ведения работ в области использования атомной энергии работникам объектов использования атомной энергии" | Приказ Ростехнадзора от 19 декабря 2018 г. № 623 Зарегистрирован Минюстом России 15 мая 2019 г. № 54629
4. | Административный регламент взаимодействия Федерального медико-биологического агентства и Федеральной службы по экологическому, технологическому и атомному надзору при проведении совместных плановых проверок в отношении юридических лиц и индивидуальных предпринимателей | Приказ ФМБА России от 19 марта 2012 г. № 52, приказ Ростехнадзора от 19 марта 2012 г. № 169. Зарегистрирован Минюстом России 20 апреля 2012 г. № 23903

5.

Административный регламент взаимодействия Федеральной службы по экологическому, технологическому и атомному надзору с Федеральной службой по надзору в сфере защиты прав потребителей и благополучия человека в части осуществления федерального государственного санитарно-эпидемиологического надзора при строительстве

Приказ Ростехнадзора от 30 мая 2012 г. № 315, приказ Роспотребнадзора от 30 мая 2012 г. № 588. Зарегистрирован Минюстом России 31 июля 2012 г.

№ 25053

6. | Административный регламент Федеральной службы по экологическому, технологическому и атомному надзору предоставления государственной услуги по выдаче разрешений на выбросы и сбросы радиоактивных веществ в окружающую среду | Приказ Ростехнадзора от 6 мая 2020 г.№ 181. Зарегистрирован Минюстом России 9 октября 2020 г. № 60318
7. | Административный регламент по исполнению Федеральной службой по экологическому, технологическому и атомному надзору государственной функции по федеральному государственному надзору в области использования атомной энергии | Приказ Ростехнадзора от 7 июня 2013 г.  № 248. Зарегистрирован Минюстом России 25 июля 2013 г. № 29174
8. | Административный регламент предоставления Федеральной службой по экологическому, технологическому и атомному надзору государственной услуги по лицензированию деятельности в области использования атомной энергии | Приказ Ростехнадзора от 8 октября 2014 г. № 453. Зарегистрирован Минюстом России 20 марта 2015 г. № 36496

9.

Административный регламент предоставления Государственной корпорацией по атомной энергии «Росатом» государственной услуги по выдаче сертификатов-разрешений на транспортирование (перевозку) ядерных материалов, радиоактиваных веществ и изделий из них, на использование опредленной конструкции транспортного упаковочного комплекта радиоактивного вещества особого вида

Госкорпорация «Росатом», приказ от 22 декабря 2017 г. № 1/60-НПА. Зарегистрирован Минюстом России 28 февраля 2018 г. № 50172

Соглашения о взаимодействии

1.

«Соглашение о взаимодействии между Министерством Российской Федерации по делам гражданской обороны, чрезвычайным ситуациям и ликвидации последствий стихийных бедствий и Федеральной службы по экологическому, технологическому и атомному надзору в области государственного регулирования безопасности атомных станций»

25 июня 2015 г. № 2-4-38-4

2. | Соглашение о взаимодействии Государственной корпорации по атомной энергии «Росатом» и Федеральной службы по экологическому, технологическому и атомному надзору при транспортировании ядерных материалов, радиоактивных веществ и изделий из них | 18 августа 2008 г. № КП-32/841
3. | Соглашение между Федеральной службой по экологическому, технологическому и атомному надзору и Федеральным медико-биологическим агентством о взаимодействии в области государственного регулирования радиационной безопасности при использовании атомной энергии | 28 декабря 2010 г. б/н
4. | Соглашение о взаимодействии Федеральной службы по экологическому, технологическому и атомному надзору и Института проблем безопасного развития атомной энергетики Российской академии наук | 29 сентября 2011 г. № 00-01-19/641
5. | Соглашение о взаимодействии между Федеральной службой по экологическому, технологическому и атомному надзору и Федеральной службой по гидрометеорологии и мониторингу окружающей среды о предоставлении информации о радиационной обстановке на территории Российской Федерации | 1 ноября 2017 г.  № 00-01-18/776

6.

Соглашение между Федеральной службой по экологическому, технологическому и атомному надзору и Министерством Российской Федерации по делам гражданской обороны, чрезвычайным ситуациям и ликвидации последствий стихийных бедствий об информационном взаимодействии при предупреждении, возникновении и ликвидации чрезвычайных ситуаций

30 августа 2017 г. № 00-01-18/625/2-4-38-9

II. Нормативные правовые и иные акты Федеральной службы по экологическому, технологическому и атомному надзору
 1. Общие документы
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1. | Сбор, переработка, хранение и кондиционирование жидких радиоактивных отходов. Требования безопасности. НП-019-15 | Ростехнадзор, приказ от 25 июня 2015 г. № 242. Зарегистрирован Минюстом России 27 июля 2015 г. № 38209
2. | Сбор, переработка, хранение и кондиционирование твердых радиоактивных отходов. Требования безопасности. НП-020-15   | Ростехнадзор, приказ от 25 июня 2015 г. № 243. Зарегистрирован Минюстом России 21 июля 2015 г. № 38118
3. | Обращение с газообразными радиоактивными отходами. Требования безопасности. НП-021-15 | Ростехнадзор, приказ от 25 июня 2015 г. № 244. Зарегистрирован Минюстом России 22 июля 2015 г. № 38130
4. | Требования к обоснованию возможности продления назначенного срока эксплуатации объектов использования атомной энергии. НП-024-2000 | Госатомнадзор России, постановление от 28 декабря 2000 г. № 16
5. | Правила устройства и безопасной эксплуатации грузоподъемных машин и механизмов, применяемых на объектах использования атомной энергии. НП-043-18 | Ростехнадзор, приказ от 2 марта 2018 г. № 92. Зарегистрирован Минюстом России 2 апреля 2018 г. № 50582
6. | Правила устройства и безопасной эксплуатации сосудов, работающих под избыточным давлением, для объектов использования атомной энергии. НП-044-18 | Ростехнадзор, приказ от 2 марта 2018 г. № 93. Зарегистрирован Минюстом России 2 апреля 2018 г. № 50584
7. | Правила устройства и безопасной эксплуатации трубопроводов пара и горячей воды для объектов использования атомной энергии. НП-045-18 | Ростехнадзор, приказ от 2 марта 2018 г. № 94. Зарегистрирован Минюстом России 2 апреля 2018 г. № 50583
8. | Правила устройства и безопасной эксплуатации паровых и водогрейных котлов для объектов использования атомной энергии. НП-046-18 | Ростехнадзор, приказ от 19 марта 2018 г. № 113. Зарегистрирован Минюстом России 11 апреля 2018 г. № 50707
9. | Безопасность при обращении с радиоактивными отходами. Общие положения. НП-058-14 | Ростехнадзор, приказ от 5 августа 2014 г. № 347. Зарегистрирован Минюстом России 14 ноября 2014 г. № 34701
10. | Правила безопасности при хранении и транспортировании ядерного топлива на объектах использования атомной энергии. НП-061-05 | Ростехнадзор, постановление от 30 декабря 2005 г. № 23
11. | Учет внешних воздействий природного и техногенного происхождения на объекты использования атомной энергии. НП-064-17 | Ростехнадзор, приказ от 30 ноября 2017 г. № 514. Зарегистрирован Минюстом России 26 декабря 2017 г. № 49461
12. | Правила оценки соответствия оборудования, комплектующих, материалов и полуфабрикатов, поставляемых на объекты использования атомной энергии. НП-071-06 | Ростехнадзор, постановление от 5 сентября 2006 г. № 4

13.

Правила оценки соответствия продукции, для которой устанавливаются требования, связанные с обеспечением безопасности в области использования атомной энергии, а также процессов ее проектирования (включая изыскания), производства, строительства, монтажа, наладки, эксплуатации, хранения, перевозки, реализации, утилизации и захоронения.

НП-071-18

Ростехнадзор, приказ от 6 февраля 2018 г. № 52. Зарегистрирован Минюстом России 7 марта 2018 г.  № 50282

14. | Требования к программам обеспечения качества для объектов использования атомной энергии. НП-090-11 | Ростехнадзор, приказ от 7 февраля 2012 г. № 85. Зарегистрирован Минюстом России 19 марта 2012 г.  № 23509
15. | Обеспечение безопасности при выводе из эксплуатации объектов использования атомной энергии. Общие положения. НП-091-14 | Ростехнадзор, приказ от 20 мая 2014 г. № 216. Зарегистрирован Минюстом России 14 июля 2014 г. № 33086
16. | Критерии приемлемости радиоактивных отходов для захоронения. НП-093-14 | Ростехнадзор, приказ от 15 декабря 2014 г. № 572. Зарегистрирован Минюстом России 27 марта 2015 г. № 36592
17. | Требования к обеспечению безопасности при выводе из эксплуатации пунктов хранения радиоактивных отходов. НП-097-16 | Ростехнадзор, приказ от 21 июля 2016 г. № 304 Зарегистрирован Минюстом России 12 августа 2016 г. № 43223
Руководства по безопасности
1. | Рекомендации по методам и средствам контроля сбросов радиоактивных веществ в водные объекты. РБ-005-21 | Ростехнадзор, приказ от 16 февраля 2021 г. № 61.
2. | Определение исходных сейсмических колебаний грунта для проектных основ. РБ-006-98 | Госатомнадзор России, постановление от 29 декабря 1998 г. № 3
3. | Оценка исходной сейсмичности района и площадки размещения объекта использования атомной энергии при инженерных изысканиях и исследованиях. РБ-019-18 | Ростехнадзор, приказ от 2 марта 2018 г. № 90
4. | Рекомендации по оценке характеристик смерча для объектов использования атомной энергии. РБ-022-01 | Госатомнадзор России, постановление от 28 декабря 2001 г. № 17
5. | Динамический мониторинг строительных конструкций объектов использования атомной энергии. РБ-045-08 | Ростехнадзор, приказ от 29 декабря 2008 г. № 1037
6. | Мониторинг гидрологических, метеорологических и аэрологических условий в районах размещения объектов использования атомной энергии. РБ-046-21 | Ростехнадзор, приказ от 1 февраля 2021 г. № 31.
7. | Положение о разработке программ обеспечения качества при проектировании и конструировании изделий, поставляемых на объекты использования атомной энергии. РБ-051-10 | Ростехнадзор, приказ от 8 июня 2010 г. № 467
8. | Положение о разработке программ обеспечения качества при изготовлении изделий, поставляемых на объекты использования атомной энергии. РБ-055-10 | Ростехнадзор, приказ от 5 марта 2010 г. № 144
9. | Рекомендации по содержанию документов, обосновывающих нормативы предельно допустимых выбросов радиоактивных веществ в атмосферный воздух и нормативы допустимых сбросов радиоактивных веществ в водные объекты. РБ-085-21 | Ростехнадзор, приказ от 23 сентября 2021 г. № 326.
10. | Рекомендации по разработке программ обеспечения качества при обращении с радиоактивными отходами. РБ-086-13 | Ростехнадзор, приказ от 6 сентября 2013 г.  № 390
11. | Рекомендуемые методы расчета параметров, необходимых для разработки и установления нормативов предельно допустимых выбросов радиоактивных веществ в атмосферный воздух. РБ-106-21 | Ростехнадзор, приказ от 30 августа 2021 г. № 288.
12. | Рекомендации к разработке вероятностного анализа безопасности для хранилищ отработавшего ядерного топлива. РБ-116-17 | Ростехнадзор, приказ от 10 февраля 2017 г. № 51
13. | Руководство по анализу опасности аварийных взрывов и определению параметров их механического действия. РБ Г-05-039-96 | Госатомнадзор России, постановление от 31 декабря 1996 г. № 100
14. | Рекомендуемые методы расчета параметров, необходимых для разработки нормативов допустимых сбросов радиоактивных веществ в водные объекты. РБ-126-21 | Ростехнадзор, приказ от 9 сентября 2021 г. № 297.
15. | Рекомендации по разработке программ обеспечения качества при выводе из эксплуатации объектов использования атомной энергии. РБ-114-16 | Ростехнадзор, приказ от 30 августа 2016 г. № 367
16. | Рекомендации по методам и средствам контроля за выбросами радиоактивных веществ в атмосферный воздух. РБ-135-17 | Ростехнадзор, приказ от 30 августа 2017 г. № 347
17. | Рекомендации по разработке программ обеспечения качества при сооружении объектов использования атомной энергии. РБ-143-18 | Ростехнадзор, приказ от 15 мая 2018 г. № 214
18. | Сейсмологический мониторинг участков размещения ядерно и радиационно опасных объектов. РБ-142-18 | Ростехнадзор, приказ от 27 ноября 2018 г. № 592.
19. | Рекомендации по проведению заключительного обследования выводимого из эксплуатации объекта использования атомной энергии. РБ-124-16 | Ростехнадзор, приказ от 14 декабря 2016 г. № 532.
20. | Рекомендации по обоснованию выбора варианта вывода из эксплуатации объектов использования атомной энергии. РБ-153-18 | Ростехнадзор, приказ от 29 декабря 2018 г. № 666
21. | Рекомендации по проведению комплексного инженерного и радиационного обследования объекта использования атомной энергии. РБ-159-19 | Ростехнадзор, приказ от 11 ноября 2019 г. № 432
22. | Рекомендации по разработке программы комплексного инженерного и радиационного обследования объекта использования атомной энергии. РБ-160-19 | Ростехнадзор, приказ от 28 октября 2019 г. № 412
23. | Рекомендации к обоснованию остаточного ресурса строительных конструкций объектов использования атомной энергии. РБ-167-20 | Ростехнадзор, приказ от 7 декабря 2020 г. № 502.
24. | Рекомендации по разработке концепции вывода из эксплуатации объекта использования атомной энергии. РБ-008-21 | Ростехнадзор, приказ от 30 июля 2021 г. № 265

2. Атомные станции
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1. | Общие положения обеспечения безопасности атомных станций. НП-001-15 | Ростехнадзор, приказ от 17 декабря 2015 г. №522. Зарегистрирован Минюстом России 2 февраля 2016 г. № 40939
2. | Правила безопасности при обращении с радиоактивными отходами атомных станций. НП-002-15 | Ростехнадзор, приказ от 30 января 2015 г. № 35. Зарегистрирован Минюстом России 27 февраля 2015 г. № 36293
3. | Требования к полномасштабным тренажерам для подготовки операторов блочного пункта управления атомной станции.  НП-003-97 (ПНАЭ Г-5-40-97) | Госатомнадзор России, постановление от 15 апреля 1997 г. № 2
4. | Положение о порядке расследования и учета нарушений в работе атомных станций. НП-004-08 | Ростехнадзор, постановление от 14 мая 2008 г. № 3
5. | Положение о порядке объявления аварийной обстановки, оперативной передачи информации и организации экстренной помощи атомным станциям в случае радиационно опасных ситуаций. НП-005-16 | Ростехнадзор, приказ от 24 февраля 2016 г. № 68. Зарегистрирован Минюстом России 25 марта 2016 г. № 41573
6. | Требования к содержанию отчета по обоснованию безопасности блока атомной станции с реактором типа ВВЭР. НП-006-16 | Ростехнадзор, приказ от 13 февраля 2017 г. № 53. Зарегистрирован Минюстом России 10 мая 2017 г. № 46663
7. | Правила устройства и эксплуатации локализующих систем безопасности атомных станций. НП-010-16 | Ростехнадзор, приказ от 24 февраля 2016 г. № 70. Зарегистрирован Минюстом России 25 марта 2016 г. № 41574
8. | Правила обеспечения безопасности при выводе из эксплуатации блока атомной станции. НП-012-16 | Ростехнадзор, приказ от 10 января 2017 г. № 5. Зарегистрирован Минюстом России 22 февраля 2017 г. № 45740
9. | Типовое содержание плана мероприятий по защите персонала в случае аварии на атомной станции. НП-015-12 | Ростехнадзор, приказ от 18 сентября 2012 г. № 518. Зарегистрирован Минюстом России 12 февраля 2013 г. № 27011
10. | Основные требования к продлению срока эксплуатации блока атомной станции. НП-017-18 | Ростехнадзор, приказ от 5 апреля 2018 г. № 162. Зарегистрирован Минюстом России 4 мая 2018 г. № 50977
11. | Требования к содержанию отчета по обоснованию безопасности атомных станций с реакторами на быстрых нейтронах. НП-018-05 | Ростехнадзор, постановление от 2 декабря 2005 г. № 9. Зарегистрировано Минюстом России от 26 января 2006 г. № 7413
12. | Требования к управляющим системам, важным для безопасности атомных станций. НП-026-16 | Ростехнадзор, приказ от 16 ноября 2016 г. № 483. Зарегистрирован Минюстом России 1 декабря 2016 г. № 44712
13. | Нормы проектирования сейсмостойких атомных станций. НП-031-01 | Госатомнадзор России, Постановление от 19 октября 2001 г.  № 9
14. | Площадка атомной станции. Требования безопасности. НП-032-19. | Ростехнадзор, приказ от 19 июля 2019 г. № 287. Зарегистрирован Минюстом России 2 декабря 2019 г., № 56661
15. | Правила устройства и эксплуатации систем вентиляции, важных для безопасности атомных станций. НП-036-05 | Ростехнадзор, постановление от 7 ноября 2005 г. № 6
16. | Правила обеспечения водородной взрывозащиты на атомной станции. НП-040-02 | Госатомнадзор России, постановление от 31 декабря 2002 г. № 14
17. | Трубопроводная арматура для атомных станций. Общие технические требования. НП-068-05 | Ростехнадзор, постановление от 31 декабря 2005 г. № 25
18. | Основные требования к тепловыделяющим элементам и тепловыделяющим сборкам с уран-плутониевым (МОКС) топливом для атомных станций. НП-080-07 | Ростехнадзор, постановление от 29 июня 2007 г. № 1
19. | Правила ядерной безопасности реакторных установок атомных станций. НП-082-07 | Ростехнадзор, постановление от 10 декабря 2007 г. № 4. Зарегистрировано Минюстом России 21 января 2008 г. № 10951
20. | Правила контроля основного металла, сварных соединений и наплавленных поверхностей при эксплуатации оборудования, трубопроводов и других элементов атомных станций. НП-084-15 | Ростехнадзор, приказ от 7 декабря 2015 г. № 502. Зарегистрирован Минюстом России 10 марта 2016 г. № 41366
21. | Правила устройства и безопасной эксплуатации исполнительных механизмов органов воздействия на реактивность. НП-086-12 | Ростехнадзор, приказ от 21 марта 2012 г. № 176. Зарегистрирован Минюстом России 11 апреля 2012 г. № 23796
22. | Требования к системам аварийного электроснабжения атомных станций. НП-087-11 | Ростехнадзор, приказ от 30 ноября 2011 г. № 671. Зарегистрирован Минюстом России 3 февраля 2012 г. № 23123
23. | Правила устройства и безопасной эксплуатации оборудования и трубопроводов атомных энергетических установок. НП-089-15 | Ростехнадзор, приказ от 17 декабря 2015 г. № 521. Зарегистрирован Минюстом России 9 февраля 2016 г. № 41010
24. | Основные требования к вероятностному анализу безопасности блока атомной станции. НП-095-15 | Ростехнадзор, приказ от 12 августа 2015 г. № 311. Зарегистрирован Минюстом России 4 сентября 2015 г. № 38807
25. | Требования к управлению ресурсом оборудования и трубопроводов атомных электростанций. Основные положения. НП-096-15 | Ростехнадзор, приказ от 15 октября 2015 г. № 410. Зарегистрирован Минюстом России 11 ноября 2015 г. № 39666
26. | Основные требования к обоснованию прочности и термомеханического поведения тепловыделяющих сборок и тепловыделяющих элементов в активной зоне водо-водяных энергетических реакторов. НП-094-15 | Ростехнадзор, приказ от 18 января 2016 г. № 13. Зарегистрирован Минюстом России 21 апреля 2016 г. № 41891
27. | Основные требования к обоснованию прочности внутрикорпусных устройств реакторов типа ВВЭР. НП-102-17 | Ростехнадзор, приказ от 5 октября 2017 г. № 409. Зарегистрирован Минюстом России 30 октября 2017 г.  № 48734
28. | Нормы расчета на прочность оборудования и трубопроводов атомных энергетических установок. ПНАЭ Г-7-002-86 | Госатомэнергонадзор СССР, постановление от 5 ноября 1986 г. № 5. Государственный комитет СССР по использованию атомной энергии, 1986 г.
29. | Сварка и наплавка оборудования и трубопроводов атомных энергетических установок. НП-104-18 | Ростехнадзор, приказ от 14 ноября 2018 г. № 554. Зарегистрирован Минюстом России 25 декабря 2018 г., № 53156.
30. | Правила контроля металла оборудования и трубопроводов атомных энергетических установок при изготовлении и монтаже. НП-105-18 | Ростехнадзор, приказ от 14 ноября 2018 г. № 553. Зарегистрирован Минюстом России 20 декабря 2018 г., № 53090.
31. | Правила устройства и безопасной эксплуатации корпуса блока реакторного, оборудования, трубопроводов и внутрикорпусных устройств ядерной энергетической установки со свинцовым теплоносителем. НП-107-21 | Ростехнадзор, приказ от 24 марта 2021 г. № 112 Зарегистрирован Минюстом России 28 мая 2021 г., № 63670.
32. | Требования к обоснованию прочности корпуса блока реакторного, оборудования, трубопроводов и внутрикорпусных устройств ядерной энергетической установки со свинцовым теплоносителем. НП-108-21 | Ростехнадзор, приказ от 21 июля 2021 г. № 258 (зарегистрирован Минюстом России 5 октября 2021 г., № 65290).
Руководства по безопасности
1. | Рекомендации к содержанию отчета по углубленной оценке безопасности действующих энергоблоков атомных станций. РБ-001-19. | Ростехнадзор, приказ от 23 октября 2019 г. № 402
2. | Водно-химический режим атомных станций. Основные требования безопасности. РБ-002-16 | Ростехнадзор, приказ от 23 августа 2016 г. № 350
3. | Учет флюенса быстрых нейтронов на корпусах и образцах- свидетелях ВВЭР для последующего прогнозирования радиационного ресурса корпусов. РБ-007-99 | Госатомнадзор России, постановление от 21 апреля 1999 г. № 2
4. | Требования к содержанию программы вывода из эксплуатации блока атомной станции. РБ-013-2000 | Госатомнадзор России, постановление от 4 ноября 2000 г. № 13
5. | Методика нейтронного контроля на внешней поверхности корпусов водо-водяных энергетических реакторов АЭС. РБ-018-01 | Госатомнадзор России, постановление от 17 декабря 2001 г. № 14
6. | Рекомендации по разработке вероятностного анализа безопасности уровня 1 блока атомной станции для исходных событий, обусловленных внешними воздействиями. РБ-021-21 | Ростехнадзор, приказ от 19 мая 2021 г. № 184.
7. | Рекомендации по разработке вероятностного анализа безопасности уровня 1 блока атомной станции для внутренних исходных событий. РБ-024-19 | Ростехнадзор, приказ от 17 июля 2019 г. № 284
8. | Состав и содержание отчета по результатам комплексного обследования блока атомной станции для продления срока его эксплуатации. РБ-027-04 | Госатомнадзор России, постановление от 25 мая 2004 г. № 4
9. | Анализ несоответствий блока атомной станции требованиям действующих нормативных документов. РБ-028-04 | Госатомнадзор России, Постановление от 25 мая 2004 г. № 5
10. | Состав и содержание материалов по обоснованию остаточного ресурса элементов блока атомной станции для продления срока его эксплуатации. РБ-029-04 | Госатомнадзор России, Постановление от 25 мая 2004 г. № 6
11. | Анализ опыта эксплуатации при продлении срока эксплуатации блока АС. РБ-030-04 | Госатомнадзор России, Постановление от 25 мая 2004 г. № 7
12. | Состав и содержание отчета по обоснованию безопасности при выводе из эксплуатации блока атомной станции. РБ-031-04 | Госатомнадзор России, постановление от 29 марта 2004 г. № 2
13. | Расчетные соотношения и методики расчета гидродинамических и тепловых характеристик элементов и оборудования водоохлаждаемых ядерных энергетических установок. РБ-040-09 | Ростехнадзор, Приказ от 20 июля 2009 г. № 641
14. | Руководство по проведению периодической оценки безопасности блока атомной станции. РБ-041-07 | Ростехнадзор, постановление от 10 декабря 2007 г. № 5
15. | Рекомендации по разработке вероятностного анализа безопасности уровня 2 для блока атомной станции. РБ-044-18 | Ростехнадзор, приказ от 9 августа 2018 г. № 355
16. | Положение о проведении верификации и экспертизы программных средств по направлению «Нейтронно-физические расчеты». РБ-061-11 | Ростехнадзор, приказ от 6 мая 2011 г. № 228
17. | Положение о рекомендациях к сопоставлению рассчитанной и измеренной реактивности при обосновании ядерной безопасности реакторных установок типа ВВЭР. РБ-074-12 | Ростехнадзор, приказ от 24 апреля 2012 г. № 264
18. | Расчетные соотношения и методики расчета гидродинамических и тепловых характеристик элементов и оборудования ядерных энергетических установок с жидкометаллическим теплоносителем. РБ-075-12 | Ростехнадзор, приказ от 31 августа 2012 г. № 484
19. | Рекомендации по разработке вероятностного анализа безопасности уровня 1 блока атомной станции для исходных событий, обусловленных внутриплощадочными пожарами и затоплениями. РБ-076-20 | Ростехнадзор, приказ от 5 октября 2020 г. № 387
20. | Оценка эффективности корректирующих мер по нарушениям в работе атомных электрических станций и исследовательских ядерных установок и анализ информации об опыте эксплуатации атомных электрических станций и исследовательских ядерных установок. РБ-080-13 | Ростехнадзор, приказ от 12 марта 2013 г. № 103
21. | Структура и содержание отчета по результатам комплексного инженерного и радиационного обследования для вывода из эксплуатации блока атомной станции. РБ-081-13 | Ростехнадзор, приказ от 1 февраля 2013 г. № 46
22. | Минимизация радиационных последствий для населения и персонала при ликвидации последствий аварий на энергоблоках атомных электростанций разных типов. Методика оптимизации мер по защите населения и территорий. РБ-094-14 | Ростехнадзор, приказ от 19 марта 2014 г. № 107
23. | Рекомендации по порядку выполнения анализа надежности систем и элементов атомных станций, важных для безопасности, и их функций.  РБ-100-15 | Ростехнадзор, приказ от 28 января 2015 г. № 26
24. | Рекомендации к структуре и содержанию руководства по управлению авариями, в том числе тяжелыми авариями. РБ-102-15 | Ростехнадзор, приказ от 24 июля 2015 г. № 288
25. | Рекомендации по использованию вероятностного анализа безопасности при оценке нарушений в работе атомных станций. РБ-104-16 | Ростехнадзор, приказ от 1 июля 2016 г. № 281
26. | Рекомендации по применению риск-информативного метода при обосновании риск-информативных решений, связанных с безопасностью блока атомной станции. РБ-101-16 | Ростехнадзор, приказ от 2 ноября 2016 г. № 458
27. | Рекомендации к структуре и содержанию технологического регламента эксплуатации блока атомной станции с реактором типа ВВЭР. РБ-121-16 | Ростехнадзор, приказ от 14 декабря 2016 г. № 533
28. | Основные рекомендации к разработке вероятностного анализа безопасности уровня 1 для блока атомной станции при исходных событиях, обусловленных сейсмическими воздействиями. РБ-123-17 | Ростехнадзор, приказ от 1 февраля 2017 г. № 33
29. | Рекомендации по формированию и поддержанию культуры безопасности на атомных станциях и в эксплуатирующих организациях атомных станций. РБ-129-17 | Ростехнадзор, приказ от 19 сентября 2017 г. № 371
30. | Установление и методы мониторинга ресурсных характеристик арматуры атомных станций. РБ-131-17 | Ростехнадзор, приказ от 25 сентября 2017 г. № 378
31. | Установление и методы мониторинга ресурсных характеристик, работающих под давлением оборудования и трубопроводов атомных станций. РБ-132-17 | Ростехнадзор, приказ от 25 сентября 2017 г. № 379
32. | Установление и методы мониторинга ресурсных характеристик насосов атомных станций. РБ-133-17 | Ростехнадзор, приказ от 28 сентября 2017 г. № 396
33. | Установление и методы мониторинга ресурсных характеристик электротехнического оборудования атомных станций. РБ-136-17 | Ростехнадзор, приказ от 13 октября 2017 г. № 429
34. | Состав и содержание паспорта реакторной установки блока атомной станции. РБ-137-17 | Ростехнадзор, приказ от 19 января 2018 г. № 24
35. | Установление и методы мониторинга ресурсных характеристик контрольно-измерительных приборов и автоматики атомных станций. РБ-138-17 | Ростехнадзор, приказ от 11 октября 2017 г. № 421
36. | Системы аварийного мониторинга атомных станций с водо-водяными энергетическими реакторами. Общие рекомендации и номенклатура контролируемых параметров. РБ-140-17 | Ростехнадзор, приказ от 30 января 2018 г. № 42
37. | Мониторинг радиационной нагрузки и определение радиационного ресурса оборудования ВВЭР. РБ-145-18 | Ростехнадзор, приказ от 1 июня 2018 г. № 239
38. | Рекомендации по формированию окончательного перечня запроектных аварий, подлежащих учету в проекте атомных станций с реакторами типа ВВЭР. РБ-150-18 | Ростехнадзор, приказ от 13 августа 2018 г. № 359.
39. | Комментарии к федеральным нормам и правилам «Общие положения обеспечения безопасности атомных станций» НП-001-15». РБ-152-18 | Ростехнадзор, приказ от 3 октября 2018 г. № 486.
40. | Типовое содержание технического обоснования безопасности атомных станций. ТС ТОБ АС-85. ПНАЭ Г-1-001-85 | Госатомэнергонадзор СССР, Постановление от 29 октября 1985 г.; Минздрав СССР, 25 октября 1985 г.
41. | Правила аттестации сварщиков оборудования и трубопроводов атомных энергетических установок. ПНАЭ Г-7-003-87 | Госатомэнергонадзор СССР, постановление от 2 апреля 1987 г. № 5
42. | Стальные отливки для атомных энергетических установок. Правила контроля. ПНАЭ Г-7-025-90 | Госпроматомнадзор СССР, постановление от 29 мая 1991 г. № 6
43. | Нормы проектирования железобетонных сооружений локализующих систем безопасности атомных станций. ПНАЭ Г-10-007-89 | Госатомэнергонадзор СССР, постановление от 25 октября 1989 г. № 14
44. | Нормы расчета на прочность стальных защитных оболочек атомных станций.  ПНАЭ Г-10-012-89 | Госатомэнергонадзор СССР, постановление от 26 октября 1989 г. № 15
45. | Основные положения по сварке элементов локализующих систем безопасности атомных станций. ПНАЭ Г-10-031-92 | Госатомнадзор России, постановление от 17 февраля 1993 г. № 2
46. | Правила контроля сварных соединений элементов локализующих систем безопасности атомных станций. ПНАЭ Г-10-032-92 | Госатомнадзор России, Постановление от 17 февраля 1993 г. № 2
47. | Рекомендации по планированию и обоснованию сокращения объема технического обслуживания, вывода из эксплуатации отдельных систем и элементов, изменения числа оперативного персонала блока атомной станции, остановленного для вывода из эксплуатации. РБ-158-19 | Ростехнадзор, приказ от 19 июля 2019 г. № 286.
48. | Рекомендации по оценке погрешностей и неопределенностей результатов расчетных анализов безопасности атомных станций. РБ-166-20 . | Ростехнадзор, приказ от 30 июля 2020 г. № 288
49. | Рекомендации по разработке программ обеспечения качества при эксплуатации атомных станций и исследовательских ядерных установок РБ-009-21 | Ростехнадзор, приказ от 27 сентября 2021 г. № 334

 3. Сооружения и комплексы с экспериментальными и исследовательскими ядерными реакторами, критическими и подкритическими ядерными стендами
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1. | Общие положения обеспечения безопасности исследовательских ядерных установок. НП-033-11 | Ростехнадзор, приказ от 30 июня 2011 г. № 348. Зарегистрирован Минюстом России 29 августа 2011 г. № 21700
2. | Правила ядерной безопасности критических стендов. НП-008-16 | Ростехнадзор, приказ от 23 августа 2016 г. № 348. Зарегистрировано Минюстом России 3 ноября 2016 г. № 44233
3. | Правила ядерной безопасности исследовательских реакторов. НП-009-17 | Ростехнадзор, приказ от 4 августа 2017 г. № 295. Зарегистрирован Минюстом России 31 августа 2017 г. № 48033
4. | Положение о порядке расследования и учета нарушений в работе исследовательских ядерных установок. НП-027-10 | Минприроды России, приказ от 31 мая 2010 г. № 185. Зарегистрирован Минюстом России 19 июля 2010 г. № 17888
5. | Правила обеспечения безопасности при выводе из эксплуатации исследовательских ядерных установок. НП-028-16 | Ростехнадзор, приказ от 4 апреля 2017 г. № 108. Зарегистрирован Минюстом России 4 мая 2017 г. № 46597
6. | Правила ядерной безопасности импульсных исследовательских ядерных реакторов. НП-048-03 | Госатомнадзор России, постановление от 31 декабря 2003 г. № 9
7. | Требования к содержанию отчета по обоснованию безопасности исследовательских ядерных установок. НП-049-17 | Ростехнадзор, приказ от 5 декабря 2017 г. № 528. Зарегистрирован Минюстом России 28 декабря 2017 г. № 49534
8. | Правила ядерной безопасности подкритических стендов. ПБЯ ПКС-2005. НП-059-05 | Ростехнадзор, постановление от 4 мая 2005 г. № 2
9. | Требования к содержанию плана мероприятий по защите персонала в случае аварии на исследовательских ядерных установках. НП-075-19 | Ростехнадзор, приказ от 14 мая 2019 г. № 181 Зарегистрирован Минюстом России 8 ноября 2019 г., № 56486.
10. | Правила контроля основного металла, сварных соединений и наплавленных поверхностей при эксплуатации оборудования, трубопроводов и других элементов атомных станций. НП-084-15 | Ростехнадзор, приказ от 7 декабря 2015 г. № 502. Зарегистрирован Минюстом России 10 марта 2016 г. № 41366
11. | Правила устройства и безопасной эксплуатации оборудования и трубопроводов атомных энергетических установок. НП-089-15 | Ростехнадзор, приказ от 17 декабря 2015 г. № 521. Зарегистрирован Минюстом России 9 февраля 2016 г. № 41010
12. | Периодическая оценка безопасности исследовательских ядерных установок. НП-092-14 | Ростехнадзор, приказ от 12 сентября 2014 г. № 412. Зарегистрирован Минюстом России 19 февраля 2015 г. № 36109
13. | Нормы расчета на прочность оборудования и трубопроводов атомных энергетических установок. ПНАЭ Г-7-002-86 | Госатомэнергонадзор СССР, постановление от 5 ноября 1986 г. № 5. Государственный комитет СССР по использованию атомной энергии, 1986 г.
14. | Сварка и наплавка оборудования и трубопроводов атомных энергетических установок. НП-104-18 | Ростехнадзор, приказ от 14 ноября 2018 г.  № 554. Зарегистрирован Минюстом России 25 декабря 2018 г., № 53156.
15. | Правила контроля металла оборудования и трубопроводов атомных энергетических установок при изготовлении и монтаже. НП-105-18 | Ростехнадзор, приказ от 14 ноября 2018 г. № 553. Зарегистрирован Минюстом России 20 декабря 2018 г., № 53090.
16. | Положение о порядке объявления аварийной обстановки, оперативной передачи информации в случаях радиационно опасных ситуаций на исследовательских ядерных установках. НП-106-19 | Ростехнадзор, приказ от 9 сентября 2019 г. № 351 Зарегистрирован Минюстом России 29 ноября 2019 г., № 56651.
Руководства по безопасности
1. | Содержание годового отчета эксплуатирующей организации по оценке состояния ядерной и радиационной безопасности исследовательских ядерных установок. РБ-025-15 | Ростехнадзор, приказ от 22 октября 2015 г. № 421
2. | Положение о проведении верификации и экспертизы программных средств по направлению «Нейтронно-физические расчеты». РБ-061-11 | Ростехнадзор, приказ от 6 мая 2011 г. № 228
3. | Положение о составе и содержании документации по комплексному обследованию исследовательских ядерных установок при продлении срока эксплуатации. РБ-073-12 | Ростехнадзор, приказ от 9 февраля 2012 г. № 89
4. | Оценка эффективности корректирующих мер по нарушениям в работе атомных электрических станций и исследовательских ядерных установок и анализ информации об опыте эксплуатации атомных электрических станций и исследовательских ядерных установок. РБ-080-13 | Ростехнадзор, приказ от 12 марта 2013 г. № 103
5. | Рекомендации к разработке вероятностного анализа безопасности для исследовательских ядерных реакторов. РБ-108-16 | Ростехнадзор, приказ от 19 февраля 2016 г. № 61
6. | Самооценка эксплуатирующей организации текущего состояния ядерной и радиационной безопасности по результатам анализа нарушений в работе исследовательских ядерных установок. РБ-147-18 | Ростехнадзор, приказ от 4 июня 2018 г. № 245
7. | Рекомендации по разработке программ обеспечения качества при эксплуатации атомных станций и исследовательских ядерных установок. РБ-009-21 | Ростехнадзор, приказ от 27 сентября 2021 г. № 334
8. | Правила аттестации сварщиков оборудования и трубопроводов атомных энергетических установок. ПНАЭ Г-7-003-87 | Госатомэнергонадзор СССР, постановление от 2 апреля 1987 г. № 5
9. | Оборудование и трубопроводы атомных энергетических установок. Дуговая сварка алюминиевых сплавов в защитных газах. Основные положения. ПНАЭ Г-7-022-90 | Госпроматомнадзор СССР, Постановление от 12 июня 1990 г. № 8
10. | Стальные отливки для атомных энергетических установок. Правила контроля. ПНАЭ Г-7-025-90 | Госпроматомнадзор СССР, постановление от 29 мая 1991 г. № 6

4. Суда и другие плавсредства с ядерными реакторами и радиационными источниками
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1. | Общие положения обеспечения безопасности судов и других плавсредств с ядерными реакторами. НП-022-17 | Ростехнадзор, приказ от 4 сентября 2017 г. № 351. Зарегистрирован Минюстом России 27 сентября 2017 г. № 48344
2. | Требования к отчету по обоснованию безопасности судов и других плавсредств с ядерными реакторами. НП-023-20 | Ростехнадзор, приказ от 22 июня 2020 г. № 236. Зарегистрирован Минюстом России 18 ноября 2020 г. № 60955.
3. | Правила ядерной безопасности судов и других плавсредств с ядерными реакторами. НП-029-17 | Ростехнадзор, приказ от 4 сентября 2017 г. № 352. Зарегистрирован Минюстом России 27 сентября 2017 г. № 48343
4. | Правила обеспечения безопасности при выводе из эксплуатации судов и иных плавсредств с ядерными установками и радиационными источниками. НП-037-11 | Ростехнадзор, приказ от 29 ноября 2011 г. № 666. Зарегистрирован Минюстом России 19 января 2012 г. № 22979
5. | Нормы расчета на прочность элементов оборудования и трубопроводов для судовых атомных паропроизводящих установок с водо-водяными реакторами. НП-054-04 | Ростехнадзор, постановление от 4 октября 2004 г. № 6
6. | Правила устройства и безопасной эксплуатации оборудования и изделий реакторных установок с водным теплоносителем плавучих атомных станций. НП-062-05 | Ростехнадзор, постановление от 20 декабря 2005 г. № 1
7. | Требования к планированию мероприятий по действиям и защите персонала при ядерных и радиационных авариях на судах и других плавсредствах с ядерными реакторами. НП-079-18 | Ростехнадзор, приказ от 27 июня 2018 г. № 278. Зарегистрирован Минюстом России 3 сентября 2018 г., № 52051
8. | Положение о порядке расследования и учета нарушений в работе судов и с ядерными установками и радиационными источниками. НП-088-11 | Ростехнадзор, приказ от 29 ноября 2011 г. № 667. Зарегистрирован Минюстом России 13 апреля 2012 г. № 23835
9. | Общие положения обеспечения безопасности судов атомно-технологического обслуживания. НП-109-20 | Ростехнадзор, приказ от 18 марта 2020 г. № 120. Зарегистрирован Минюстом России 12 августа 2020 г., № 59247.
10. | Требования к отчету по обоснованию безопасности судов атомно-технологического обслуживания. НП-011-21 | Ростехнадзор, приказ от 23 августа 2021 г. № 285. Зарегистрирован Минюстом России 28 сентября 2021 г., № 65164
Руководства по безопасности
1. | Рекомендации по обеспечению безопасности при обращении с радиоактивными отходами на судах и других плавсредствах с ядерными реакторами и судах атомно-технологического обслуживания. РБ-010-16 |  Ростехнадзор, приказ от 15 июля 2016 г. № 302
2. | Рекомендации к составу и содержанию отчета по комплексному обследованию судов и других плавсредств с ядерными реакторами и судов атомно-технологического обслуживания при продлении срока их эксплуатации. РБ-033-22 | Ростехнадзор, приказ от 17 января 2022 г. № 8
3. | Положение о проведении верификации и экспертизы программных средств по направлению «Нейтронно-физические расчеты». РБ-061-11 | Ростехнадзор, приказ от 6 мая 2011 г. № 228
4. | Положение о содержании годового отчета по обеспечению безопасности судов и других плавсредств с ядерными реакторами, судов атомно-технологического обслуживания и объектов их инфраструктуры. РБ-067-21 | Ростехнадзор, приказ от 26 марта 2021 г. № 115
5. | Рекомендации по составу и содержанию отчета по обоснованию безопасности при выводе из эксплуатации судов и иных плавсредств с ядерными реакторами и судов атомно-технологического обслуживания. РБ-103-15 | Ростехнадзор, приказ от 15 сентября 2015 г. № 359
6. | Рекомендации по составу и содержанию программы вывода из эксплуатации судов и иных плавсредств с ядерными реакторами и судов атомно-технологического обслуживания. РБ-105-15 | Ростехнадзор, приказ от 10 ноября 2015 г. № 452
7. | Методические рекомендации по надзору за ядерной и радиационной безопасностью судов и других плавсредств с ядерными реакторами и судов атомно-технологического обслуживания при эксплуатации | Ростехнадзор, приказ от 16 июля 2019 г. № 281

5. Космические и летальные аппараты

Федеральные нормы и правила

1. | Общие положения обеспечения безопасности космических аппаратов с ядерными реакторами. НП-101-17 | Ростехнадзор, приказ от 23 октября 2017 г. № 442. Зарегистрирован Минюстом России 17 ноября 2017 г. № 48938

6. Сооружения, комплексы, установки для производства, использования, переработки, транспортирования ядерного топлива и ядерных материалов. Пункты хранения ядерных материалов и радиоактивных отходов. Пункты захоронения радиоактивных отходов. Промышленные реакторы
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1. | Общие положения обеспечения безопасности объектов ядерного топливного цикла. НП-016-05 | Ростехнадзор, постановление от 2 декабря 2005 г. № 11. Зарегистрировано Минюстом России 1 февраля 2006 г. № 7433
2. | Захоронение радиоактивных отходов. Принципы, критерии и основные требования безопасности. НП-055-14 | Ростехнадзор, приказ от 22 августа 2014 г. № 379. Зарегистрирован Минюстом России 2 февраля 2015 г. № 35819
3. | Правила обеспечения безопасности при выводе из эксплуатации промышленных уран-графитовых реакторов. НП-007-17 | Ростехнадзор, приказ от 8 сентября 2017 г. № 357. Зарегистрирован Минюстом России 2 октября 2017 г. № 48383
4. | Установки по переработке отработавшего ядерного топлива. Требования безопасности. НП-013-99 | Госатомнадзор России, постановление от 27 декабря 1999 г. № 5
5. | Пункты сухого хранения отработавшего ядерного топлива. Требования безопасности. НП-035-02 | Госатомнадзор России, Постановление от 28 июня 2002 г. № 7
6. | Положение о порядке расследования и учета нарушений в работе объектов ядерного топливного цикла. НП-047-11 | Ростехнадзор, приказ от 23 декабря 2011 г. № 736. Зарегистрирован Минюстом России 19 декабря 2012 г. № 22965
7. | Размещение ядерных установок ядерного топливного цикла. Основные критерии и требования по обеспечению безопасности. НП-050-03 | Госатомнадзор России, постановление от 31 декабря 2003 г. № 11
8. | Требования к отчету по обоснованию безопасности ядерных установок ядерного топливного цикла. НП-051-04 | Ростехнадзор, постановление от 4 октября 2004 г. № 3
9. | Правила обеспечения безопасности при временном хранении радиоактивных отходов, образующихся при добыче, переработке и использовании полезных ископаемых. НП-052-04 | Ростехнадзор, постановление от 4 октября 2004 г. № 4
10. | Правила обеспечения безопасности при выводе из эксплуатации ядерных установок ядерного топливного цикла. НП-057-17 | Ростехнадзор, приказ от 14 июня 2017 г. № 205. Зарегистрирован Минюстом России 11 июля 2017 г., № 35819
11. | Размещение пунктов хранения ядерных материалов и радиоактивных веществ. Основные критерии и требования по обеспечению безопасности. НП-060-05 | Ростехнадзор, постановление от 31 августа 2005 г. № 3
12. | Правила ядерной безопасности для объектов ядерного топливного цикла. НП-063-05 | Ростехнадзор, постановление от 20 декабря 2005 г. № 15
13. | Требования к содержанию отчета по обоснованию безопасности при проведении научно-исследовательских и опытно-конструкторских работ с плутонийсодержащими материалами на объектах ядерного топливного цикла. НП-065-05 | Ростехнадзор, постановление от 7 ноября 2005 г. № 5
14. | Требования к отчету по обоснованию безопасности пунктов хранения ядерных материалов. НП-066-05 | Ростехнадзор, постановление от 7 ноября 2005 г. № 4
15. | Приповерхностное захоронение радиоактивных отходов. Требования безопасности. НП-069-14 | Ростехнадзор, приказ от 6 июня 2014 г. № 249. Зарегистрирован Минюстом России 14 августа 2014 г. № 33583
16. | Правила устройства и безопасной эксплуатации оборудования и трубопроводов объектов ядерного топливного цикла. НП-070-06 | Ростехнадзор, постановление от 5 сентября 2006 г. № 3
17. | Установки по иммобилизации трансурановых радиоактивных отходов. Требования безопасности. НП-076-06 | Ростехнадзор, постановление от 21 декабря 2006 г. № 11
18. | Требования к содержанию плана мероприятий по защите персонала в случае аварии на предприятии ядерного топливного цикла. НП-077-06 | Ростехнадзор, постановление от 27 декабря 2006 г. № 12
19. | Положение о порядке объявления аварийной готовности, аварийной обстановки и оперативной передачи информации в случае радиационно опасных ситуаций на предприятиях ядерного топливного цикла. НП-078-06 | Ростехнадзор, постановление от 27 декабря 2006 г. № 15
20. | Правила расследования и учета нарушений при эксплуатации радиационных источников, пунктов хранения радиоактивных веществ и радиоактивных отходов и обращении с радиоактивными веществами и радиоактивными отходами. НП-014-16 | Ростехнадзор, приказ от 15 февраля 2016 г. № 49. Зарегистрирован Минюстом России 4 мая 2016 г. № 41970
21. | Требования к обеспечению безопасности при выводе из эксплуатации пунктов хранения радиоактивных отходов. НП-097-16 | Ростехнадзор, приказ от 21 июля 2016 г. № 304. Зарегистрирован Минюстом России 12 августа 2016 г. № 43223
22. | Установки по производству плутонийсодержащего ядерного топлива. Требования безопасности. НП-098-17 | Ростехнадзор, приказ от 23 июня 2017 г. № 217. Зарегистрирован Минюстом России 20 июля 2017 г. № 47476
23. | Требования к составу и содержанию отчета по обоснованию безопасности пунктов хранения радиоактивных отходов. НП-099-17 | Ростехнадзор, приказ от 23 июня 2017 г. № 219. Зарегистрирован Минюстом России 20 июля 2017 г. № 47471
24. | Требования к составу и содержанию отчета по обоснованию безопасности пунктов захоронения радиоактивных отходов. НП-100-17 | Ростехнадзор, приказ от 23 июня 2017 г. № 218. Зарегистрирован Минюстом России 20 июля 2017 г. № 47477
25. | Требования к обеспечению безопасности пунктов размещения особых радиоактивных отходов и пунктов консервации особых радиоактивных отходов. НП-103-17 | Ростехнадзор, приказ от 10 октября 2017 г. № 418. Зарегистрирован Минюстом России 2 ноября 2017 г. № 48779
Руководства по безопасности
1. | Оценка долговременной безопасности пунктов глубинного захоронения радиоактивных отходов. РБ-003-21 | Ростехнадзор, приказ от 19 марта 2021 г. № 101.
2. | Рекомендации по формированию перечня радионуклидов, контролируемых в кондиционируемых радиоактивных отходах предприятий ядерного топливного цикла. РБ-004-21 | Ростехнадзор, приказ от 7 июля 2021 г. № 251.
3. | Обеспечение безопасности при обращении с радиоактивными отходами, образующимися при добыче, переработке и использовании полезных ископаемых. РБ-014-2000 | Госатомнадзор России, постановление от 4 декабря 2000 г. № 14
4. | Рекомендации по порядку, объему, методам и средствам контроля радиоактивных отходов в целях подтверждения их соответствия критериям приемлемости для захоронения. РБ-155-20 | Ростехнадзор, приказ от 30 июня 2020 г. № 253
5. | Рекомендации по подбору, подготовке, поддержанию и повышению квалификации оперативного персонала объектов ядерного топливного цикла. РБ-034-05 | Ростехнадзор, постановление от 29 декабря 2005 г. № 21
6. | Мониторинг инженерно-геологических условий размещения объектов ядерного топливного цикла. РБ-036-06 | Ростехнадзор, постановление от 23 ноября 2006 г. № 5
7. | Состав и содержание годового отчета о ядерной и радиационной безопасности объектов ядерного топливного цикла. РБ-043-13 | Ростехнадзор, приказ от 25 ноября 2013 г. № 564
8. | Методика оценки культуры безопасности на предприятиях ядерного топливного цикла. РБ-047-16 | Ростехнадзор, приказ от 02 ноября 2016 г. № 457
9. | Положение о проектировании и изготовлении тепловыделяющих элементов и тепловыделяющих сборок с уран-плутониевым (МОКС) топливом. РБ-057-10 | Ростехнадзор, приказ от 24 мая 2010 г. № 406
10. | Положение об оценке пожаровзрывобезопасности технологических процессов радиохимических производств. РБ-060-10 | Ростехнадзор, приказ от 14 июля 2010 г. № 606
11. | Положение о проведении верификации и экспертизы программных средств по направлению «Нейтронно-физические расчеты». РБ-061-11 | Ростехнадзор, приказ от 6 мая 2011 г. № 228
12. | Обеспечение безопасности при выводе из эксплуатации (закрытии) хвостохранилищ. РБ-078-12 | Ростехнадзор, приказ от 27 декабря 2012 г. № 787
13. | Радиационные и теплофизические характеристики отработавшего ядерного топлива водо-водяных энергетических реакторов и реакторов большой мощности канальных. РБ-093-20 | Ростехнадзор, приказ от 11 марта 2020 г. № 106
14. | Рекомендации по составу и содержанию отчета по обоснованию безопасности при выводе из эксплуатации ядерных установок ядерного топливного цикла. РБ-099-14 | Ростехнадзор, приказ от 19 сентября 2014 г. № 418
15. | Обеспечение безопасности при закрытии пунктов приповерхностного захоронения радиоактивных отходов. РБ-111-16 | Ростехнадзор, приказ от 24 августа 2016 г. № 352
16. | Обеспечение безопасности при рекультивации территорий предприятий по добыче и переработке урановых и ториевых руд. РБ-113-16 | Ростехнадзор, приказ от 23 ноября 2016 г. № 491
17. | Оценка долговременной безопасности пунктов приповерхностного захоронения радиоактивных отходов. РБ-117-16 | Ростехнадзор, приказ от 14 декабря 2016 г. № 531
18. | Оценка безопасности при обращении с радиоактивными отходами до захоронения. РБ-122-16 | Ростехнадзор, приказ от 14 декабря 2016 г. № 534
19. | Оценка взрывопожароопасности сорбционных систем при переработке отработавшего ядерного топлива. РБ-125-17 | Ростехнадзор, приказ от 17 марта 2017 г. № 89
20. | Рекомендуемые методы оценки и прогнозирования радиационных последствий аварий на объектах ядерного топливного цикла. РБ-134-17 | Ростехнадзор, приказ от 16 ноября 2017 г. № 479
21. | Состав и содержание отчета по обоснованию безопасности пунктов глубинного захоронения жидких радиоактивных отходов. РБ-139-17 | Ростехнадзор, приказ от 18 января 2018 г. № 20

22.

Рекомендации по учету изменений условий эксплуатации систем и элементов остановленного объекта ядерного топливного цикла при определении возможности сокращения объема технического обслуживания и внесению соответствующих изменений в эксплуатационную документацию объектов ядерного топливного цикла. РБ-144-18

Ростехнадзор, приказ от 22 марта 2018 г. № 124

23. | Рекомендации по разработке критериев приемлемости радиоактивных отходов для захоронения при проектировании пунктов приповерхностного захоронения радиоактивных отходов. РБ-141-18 | Ростехнадзор, приказ от 25 мая 2018 г. № 228
24. | Рекомендации по переводу пунктов размещения особых радиоактивных отходов в пункты консервации особых радиоактивных отходов и пункты захоронения радиоактивных отходов. РБ-146-18 | Ростехнадзор, приказ от 8 августа 2018 г. № 342
25. | Рекомендации по составу и содержанию инструкции по ликвидации аварий в хранилищах ядерного топлива. РБ-151-19 | Ростехнадзор, приказ от 21 января 2018 г. № 23.
26. | Рекомендации по применению метода радионуклидных соотношений для определения содержания сложнодетектируемых радионуклидов в радиоактивных отходах предприятий ядерного топливного цикла. РБ-154-19 | Ростехнадзор, приказ от 4 апреля 2019 г. № 137
27. | Рекомендации по обеспечению пожаровзрывобезопасности технологических процессов с применением пирофорных материалов на объектах ядерного топливного цикла. РБ-161-19 | Ростехнадзор, приказ от 3 декабря 2019 г. № 459.
28. | Рекомендации по составу и содержанию отчета по обоснованию безопасности при обращении с ядерными материалами, радиоактивными веществами и радиоактивными отходами при их транспортировании. РБ-163-19 | Ростехнадзор, приказ от 23 декабря 2019 г. № 491
29. | Рекомендации по оценке уровня безопасности пунктов хранения и проведению анализа несоответствий требованиям действующих федеральных норм и правил в области использования атомной энергии. РБ-164-20 | Ростехнадзор, приказ от 12 марта 2020 г. № 108
30. | Требования к отчету по обоснованию безопасности пунктов хранения радиоактивных отходов в части учета внешних воздействий. ПНАЭ Г-14-038-96 | Госатомнадзор России, постановление от 31 декабря 1996 г. № 6

7. Радиационные источники и радиоактивные вещества
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1. | Общие положения обеспечения безопасности радиационных источников. НП-038-16 | Ростехнадзор, приказ от 28 сентября 2016 г. № 405. Зарегистрирован Минюстом России 24 октября 2016 г. № 44120
2. | Правила расследования и учета нарушений при эксплуатации радиационных источников, пунктов хранения радиоактивных веществ и радиоактивных отходов и обращении с радиоактивными веществами и радиоактивными отходами. НП-014-16 | Ростехнадзор, приказ от 15 февраля 2016 г. № 49. Зарегистрирован Минюстом России 4 мая 2016 г. № 41970
Руководства по безопасности
1. | Рекомендации по составу и содержанию отчета о состоянии радиационной безопасности в организациях, использующих радионуклидные источники. РБ-054-20 | Ростехнадзор, приказ от 6 августа 2020 г. № 265
2. | Рекомендации по составу и содержанию отчета по обоснованию безопасности радиационных источников. РБ-064-20 | Ростехнадзор, приказ от 6 августа 2020 г. № 264
3. | Положение о проведении инвентаризации радиоактивных веществ в организации. РБ-072-11 | Ростехнадзор, приказ от 29 декабря 2011 г. № 764

8. Транспортирование ядерных материалов, радиоактивных веществ и радиоактивных отходов
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1. | Правила безопасности при транспортировании радиоактивных материалов. НП-053-16 | Ростехнадзор, Приказ от 15 сентября 2016 г. № 388. Зарегистрирован Минюстом России 24 января 2017 г. № 45375
2. | Требования к планированию и обеспечению готовности к ликвидации последствий аварий при транспортировании ядерных материалов и радиоактивных веществ. НП-074-06 | Ростехнадзор, постановление от 12 декабря 2006 г. № 8
Руководства по безопасности
1. | Продление срока эксплуатации транспортных упаковочных комплектов, применяемых для транспортирования отработавшего ядерного топлива. РБ-048-09 | Ростехнадзор, приказ от 23 июля 2009 г. № 644
2. | Рекомендации по обеспечению безопасности при возврате продуктов переработки облучённых тепловыделяющих сборок в государство их поставщика. РБ-092-21 | Ростехнадзор, приказ от 29 декабря 2021 г. № 472.
3. | Рекомендации по составу и содержанию отчета по обоснованию безопасности контейнера двойного назначения для хранения и транспортирования отработавшего ядерного топлива. РБ-107-15 | Ростехнадзор, приказ от 25 сентября 2015 г. № 372
4. | Рекомендации по разработке программ обеспечения качества при транспортировании радиоактивных материалов. РБ-110-16 | Ростехнадзор, приказ от 27 января 2016 г. № 30
5 | Состав и содержание программы радиационной защиты при транспортировании радиоактивных материалов. РБ-127-17 | Ростехнадзор, приказ от 24 августа 2017 г. № 330

9. Физическая защита ядерных установок, радиационных источников, пунктов хранения, ядерных материалов и радиоактивных веществ
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1. | Правила физической защиты радиоактивных веществ, радиационных источников и пунктов хранения. НП-034-15 | Ростехнадзор, приказ от 21 июля 2015 г. № 280. Зарегистрирован Минюстом России 3 августа 2015 г., № 38303
2. | Правила физической защиты радиоактивных веществ и радиационных источников при их транспортировании. НП-073-11 | Ростехнадзор, приказ от 27 декабря 2011 г. № 747. Зарегистрирован Минюстом России 20 января 2012 г. № 22984
3. | Требования к системам физической защиты ядерных материалов, ядерных установок и пунктов хранения ядерных материалов. НП-083-15 | Ростехнадзор, приказ от 8 сентября 2015 г. № 343. Зарегистрирован Минюстом России 23 ноября 2015 г. № 39808
4. | Требования к физической защите судов с ядерными реакторами, судов атомно-технологического обслуживания, судов, транспортирующих ядерные материалы, и плавучих атомных станций. НП-085-19 | Ростехнадзор, приказ от 1 апреля 2019 г. № 126. Зарегистрирован Минюстом России 22 ноября 2019 г. № 56593
Руководства по безопасности
1. | Положение о составе и содержании отчета по оценке эффективности системы физической защиты на ядерном объекте. РБ-069-11 | Ростехнадзор, приказ от 29 декабря 2011 г. № 762
2. | Положение о составе и содержании отчета по анализу уязвимости ядерного объекта. РБ-070-11 | Ростехнадзор, приказ от 29 декабря 2011 г. № 765
3. | Оценка состояния системы физической защиты на радиационно опасном объекте. РБ-112-16 | Ростехнадзор, приказ от 11 октября 2016 г. № 416
4. | Рекомендации по составу и содержанию объектовых документов по физической защите радиоактивных веществ, радиационных источников и пунктов хранения. РБ-115-16 | Ростехнадзор, приказ от 28 июня 2016 г. № 271
5. | Рекомендации по проведению анализа уязвимости радиационного объекта. РБ-120-16 | Ростехнадзор, приказ от 14 декабря 2016 г. № 535
6. | Положение по установлению уровней физической защиты радиационных объектов. РБ-130-17 | Ростехнадзор, приказ от 10 октября 2017 г. № 417
7. | Рекомендации по определению мер физической защиты для мобильных радиационных источников. РБ-149-18 | Ростехнадзор, приказ от 15 октября 2018 г. № 497
8. | Рекомендации по представлению, структуре и содержанию годового отчета ядерного объекта о состоянии физической защиты ядерных материалов, ядерных установок и пунктов хранения ядерных материалов. | Ростехнадзор, приказ от 8 декабря 2015 г. № 509
9. | Рекомендации по проведению анализа уязвимости ядерного объекта. РБ-156-19. | Ростехнадзор, приказ от 22 января 2019 г. № 26
10. | Рекомендации по проведению оценки эффективности систем физической защиты объектов использования атомной энергии. РБ-157-19. | Ростехнадзор, приказ от 28 января 2019 г. № 32
11. | Рекомендации по выполнению требований к физической защите ядерных установок и пунктов хранения ядерных материалов при их проектировании и сооружении. РБ-162-20. | Ростехнадзор, приказ от 11 марта 2020 г. № 105.

10. Учет и контроль ядерных материалов, радиоактивных веществ и радиоактивных отходов
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер утверждения
Федеральные нормы и правила
1 | Основные правила учета и контроля ядерных материалов. НП-030-19 | Ростехнадзор, приказ от 18 ноября 2019 г. № 438. Зарегистрирован Минюстом России от 10 апреля 2020 г. № 58042
2 | Основные правила учета и контроля радиоактивных веществ и радиоактивных отходов в организации. НП-067-16 | Ростехнадзор, приказ от 28 ноября 2016 г. № 503. Зарегистрирован Минюстом России 21 декабря 2016 г. № 44843
3 | Правила перевода ядерных материалов в радиоактивные вещества или радиоактивные отходы. НП-072-13 | Ростехнадзор, приказ от 5 июля 2013 г. № 288.  Зарегистрирован Минюстом России 2 октября 2013 г. № 30082
Руководства по безопасности
1. | Положение о применении методов математической статистики для учета и контроля ядерных материалов. РБ-066-11 | Ростехнадзор, приказ от 14 сентября 2011 г. № 535
2. | Положение о проведении инвентаризации радиоактивных отходов в организации. РБ-071-11 | Ростехнадзор, приказ от 29 декабря 2011 г. № 763
3. | Положение о проведении инвентаризации радиоактивных веществ в организации. РБ-072-11 | Ростехнадзор, приказ от 29 декабря 2011 г. № 764
4. | Расследование и учет аномалий в учете и контроле ядерных материалов на объектах использования атомной энергии. РБ-082-13 | Ростехнадзор, приказ от 18 февраля 2013 г. № 72
5. | Рекомендации по применению средств контроля доступа в системе учета и контроля радиоактивных веществ и радиоактивных отходов. РБ-095-20 | Ростехнадзор, приказ от 13 февраля 2020 г. № 68
6. | Структура и содержание инструкции по учету и контролю радиоактивных веществ и радиоактивных отходов в организации. РБ-096-14 | Ростехнадзор, приказ от 9 июля 2014 г. № 302
7. | Организация проведения физических инвентаризаций ядерных материалов. РБ-097-14 | Ростехнадзор, приказ от 28 августа 2014 г. № 397
8. | Рекомендации по применению пломб в системе учета и контроля ядерных материалов. РБ-098-14 | Ростехнадзор, приказ от 18 августа 2014 г. № 366
9. | Рекомендации по расследованию и учету аномалий и нарушений в учете и контроле радиоактивных веществ и радиоактивных отходов в организации. РБ-165-20 | Ростехнадзор, приказ от 14 августа 2020 г. № 311
10. | Рекомендации по организации системы измерений в целях учета и контроля ядерных материалов. | Ростехнадзор, приказ от 9 сентября 2014 г. № 405.
11. | Рекомендации по выполнению правил перевода ядерных материалов в радиоактивные вещества или радиоактивные отходы. | Ростехнадзор, приказ от 14 января 2015 г. № 7
12. | Рекомендации по форме паспорта и составу данных о радионуклидном источнике, необходимых для целей государственного учета и контроля радиоактивных веществ и радиоактивных отходов. РБ-109-16 | Ростехнадзор, приказ от 24 марта 2016 г. № 113
13. | Рекомендации по проведению административного контроля в рамках системы учета и контроля радиоактивных веществ и радиоактивных отходов в организации. РБ-119-17 | Ростехнадзор, приказ от 10 февраля 2017 г. № 50
14. | Рекомендации по структуре и содержанию положения по учету и контролю ядерных материалов в организациях, осуществляющих обращение с ядерными материалами, и инструкции по учету и контролю ядерных материалов в зоне баланса материалов. РБ-118-17 | Ростехнадзор, Приказ от 27 февраля 2017 г. № 70
15. | Рекомендации по подведению баланса ядерных материалов при их физической инвентаризации в зонах баланса материалов и анализу его результатов. РБ-065-17 | Ростехнадзор, приказ от 11 декабря 2017 г. № 535
16. | Рекомендации по оформлению и проведению процедуры передачи ядерных материалов. РБ-128-17 | Ростехнадзор, приказ от 10 октября 2017 г. № 416
17. | Рекомендации по организации и проведению административного контроля состояния учета и контроля ядерных материалов. РБ-148-18 | Ростехнадзор, приказ от 28 апреля 2018 г. № 194

11. Приказы
№ п/п | Наименование документа | Федеральный орган исполнительной власти, принявший документ, дата и номер
1. | «Об утверждении и введении в действие Положения о надзоре за системой государственного учета и контроля радиоактивных веществ и радиоактивных отходов» | Ростехнадзор, приказ от 10 мая 2007 г. № 323
2. | «Об утверждении и введении в действие Типовой программы инспекции системы учета и контроля радиоактивных веществ и радиоактивных отходов в организации» | Ростехнадзор, приказ от 25 февраля 2019 г. № 80
3. | «Об утверждении Положения о порядке организации и осуществления надзора за системой государственного учета и контроля ядерных материалов» | Минприроды России, приказ от 30 декабря 2009 г. № 429. Зарегистрирован Минюстом России 4 марта 2010 г. № 16561
4. | Методические указания по проверке подразделений ведомственной охраны при проведении проверок физической защиты объектов использования атомной энергии | Ростехнадзор, приказ от 17 января 2011 г. № 14
5. | Типовая программа первоначальной подготовки инспекторского состава Федеральной службы по экологическому, технологическому и атомному надзору по вопросам надзора за физической защитой | Ростехнадзор, приказ от 8 февраля 2011 г. № 51
6. | Методические рекомендации по рассмотрению документов, обосновывающих способность осуществлять деятельность по проектированию, конструированию, изготовлению, монтажу, накладке, техническому обслуживанию и ремонту комплексов и инженерно технических средств физической защиты | Ростехнадзор, приказ от 28 июня 2011 г. № 327
7. | «Об утверждении Типовой программы первоначальной подготовки работников Федеральной службы по экологическому, технологическому и атомному надзору, осуществляющих надзор за учетом и контролем ядерных материалов» | Ростехнадзор, приказ от 9 сентября 2011 г. № 529

8.

Методические рекомендации по подготовке решения о выдаче или об отказе в выдаче лицензии на деятельность в области использования атомной энергии по результатам рассмотрения документов, обосновывающих обеспечение ядерной и радиационной безопасности в части, относящейся к физической защите ядерных материалов, ядерных установок и пунктов хранения ядерных материалов, и формированию соответствующих разделов условий действия лицензий

Ростехнадзор, приказ от 21 октября 2011 г. № 600

9. | «Об утверждении Методических рекомендаций по проверке состояния учета и контроля ядерных материалов при передачах» | Ростехнадзор, приказ от 15 декабря 2011 г. № 715
10. | Методические рекомендации по проведению проверки инженерно-технических средств физической защиты на ядерном объекте | Ростехнадзор, приказ от 23 декабря 2011 г. № 737
11. | «Об утверждении Инструкции по проведению проверки состояния учета, контроля и физической защиты ядерных материалов в связи с выявлением аномалии или несанкционированных действий» | Ростехнадзор, приказ от 26 января 2012 г. № 59
12. | Методические рекомендации по проверке организационных мероприятий в системе физической защиты ядерных объектов | Ростехнадзор, приказ от 14 февраля 2012 г. № 98
13. | «Об утверждении Методических рекомендаций по рассмотрению документов, представляемых для получения лицензии на осуществление деятельности в области использования атомной энергии, в части учета и контроля ядерных материалов» | Ростехнадзор, приказ от 26 марта 2012 г. № 186
14. | «Об утверждении Перечня областей аттестации в области промышленной безопасности, по вопросам безопасности гидротехнических сооружений, безопасности в сфере электроэнергетики» | Ростехнадзор, приказ от 4 сентября 2020 г. № 334 Зарегистрирован Минюстом России 3 февраля 2021 г., № 62362
15. | «Об утверждении Положения об автоматизированной информационной системе по регулированию безопасности в области использования атомной энергии» | Ростехнадзор, приказ от 24 июля 2012 г. № 416
16. | «Об утверждении инструкции по использованию автоматизированной информационной системы по регулированию безопасности в области использования атомной энергии» | Ростехнадзор, приказ от 2 октября 2012 г. № 551
17. | Методические рекомендации по проверке выполнения требований к физической защите ядерных материалов, ядерных установок и пунктов хранения ядерных материалов | Ростехнадзор, приказ от 10 октября 2012 г. № 562
18. | «Об утверждении Методики разработки и установления нормативов предельно допустимых выбросов радиоактивных веществ в атмосферный воздух» | Ростехнадзор, приказ от 7 ноября 2012 г. № 639 Зарегистрирован Минюстом России 18 января 2013 г. № 26595

19.

«Об утверждении Порядка представления эксплуатирующей организацией в уполномоченный орган государственного регулирования безопасности при использовании атомной энергии документов, содержащих результаты оценки безопасности ядерной установки, пункта хранения, и обосновывающих безопасность их эксплуатации, и требования к составу и содержанию этих документов»

Ростехнадзор, приказ от 14 декабря 2012 г. № 728. Зарегистрирован Минюстом России 13 марта 2013 г. № 27667

20. | «Об утверждении Правил подготовки руководств по безопасности при использовании атомной энергии в Федеральной службе по экологическому, технологическому и атомному надзору» | Ростехнадзор, приказ от 25 июня 2021 г. № 228
21. | «Об утверждении Методических рекомендаций по оценке деятельности подразделений Ростехнадзора в области учета, контроля и физической защиты ядерных материалов» | Ростехнадзор, приказ от 18 февраля 2013 г. № 73
22. | «Об утверждении Методических рекомендаций по проверке выполнения федеральных норм и правил в области использования атомной энергии «Основные правила учета и контроля радиоактивных веществ и радиоактивных отходов в организации» | Ростехнадзор, приказ от 24 сентября 2018 г. № 457
23. | «Об утверждении Методических рекомендаций по проведению оценки состояния системы физической защиты на ядерном объекте» | Ростехнадзор, приказ от 8 мая 2013 г. № 199
24. | Инструкция по структуре и содержанию годовых отчетов межрегиональных территориальных управлений по надзору за ядерной и радиационной безопасностью о состоянии физической защиты ядерных материалов, ядерных установок и пунктов хранения ядерных материалов на поднадзорных ядерных объектах | Ростехнадзор, приказ от 19 июня 2013 г. № 251
25. | «Об утверждении Методических рекомендаций по проведению проверки состояния системы учета и контроля ядерных материалов с использованием федеральной информационной системы Российской Федерации по учету и контролю ядерных материалов» | Ростехнадзор, приказ от 2 июля 2013 г. № 283
26. | Типовая программа целевой инспекции физической защиты на радиационных объектах | Ростехнадзор, приказ от 23 сентября 2013 г. № 424
27. | «Об утверждении Методических рекомендаций по оценке выявленных нарушений в системе государственного учета и контроля ядерных материалов» | Ростехнадзор, приказ от 19 декабря 2013 г. № 632
28. | «Об утверждении Типовой программы целевой инспекции физической защиты ядерных материалов, ядерных установок и пунктов хранения ядерных материалов» | Ростехнадзор, приказ от 4 марта 2014 г. № 89
29. | «Об утверждении Методических рекомендаций по проверке выполнения основных правил учета и контроля ядерных материалов» | Ростехнадзор, приказ от 12 марта 2014 г. № 98

30.

«Об утверждении методики определения размера платы за оказание услуги по проведению экспертизы безопасности (экспертизы обоснования безопасности) объектов использования атомной энергии и (или) видов деятельности в области использования атомной энергии и предельных размеров платы за проведение экспертизы одного тематического вопроса, включенного в задание на экспертизу безопасности (экспертизу обоснования безопасности) объектов использования атомной энергии и (или) видов деятельности в области использования атомной энергии»

Ростехнадзор, приказ от 24 марта 2014 г. № 114. Зарегистрирован Минюстом России 15 октября 2014 г. № 34319

31. | «Об утверждении положения о порядке проведения экспертизы безопасности (экспертизы обоснования безопасности) объектов использования атомной энергии и (или) видов деятельности в области использования атомной энергии» | Ростехнадзор, приказ от 21 апреля 2014 г. № 160. Зарегистрирован Минюстом России 23 июля 2014 г. № 33238
32. | «Об утверждении Методических рекомендаций по проверке физической инвентаризации ядерных материалов» | Ростехнадзор, приказ от 2 июня 2014 г. № 234
33. | «Об утверждении Методических рекомендаций по оценке необходимости проведения инспекционных измерений ядерных материалов» | Ростехнадзор, приказ от 28 августа 2014 г. № 395
34. | «Об утверждении Методических указаний по категоризации нарушений требований к системе физической защиты ядерных материалов, ядерных установок и пунктов хранения ядерных материалов для определения вида налагаемых санкций» | Ростехнадзор, приказ от 21 октября 2014 г. № 478
35. | Инструкция по проведению проверки сил охраны при инспектировании физической защиты радиационных источников, пунктов хранения, радиоактивных веществ | Ростехнадзор, приказ от 11 декабря 2014 г. № 556
36. | «Об утверждении Положения о системе менеджмента качества Федеральной службы по экологическому, технологическому и атомному надзору в области государственного регулирования безопасности при использовании атомной энергии» | Ростехнадзор, приказ от 11 декабря 2014 г. № 557
37. | «Об утверждении Методических рекомендаций по порядку применения пломб при надзоре за учетом и контролем ядерных материалов, радиоактивных веществ и радиоактивных отходов» | Ростехнадзор, приказ от 19 декабря 2014 г. № 581
38. | «Об утверждении Порядка разработки и утверждения федеральных норм и правил в области использования атомной энергии в Федеральной службе по экологическому, технологическому и атомному надзору» | Ростехнадзор, приказ от 7 июля 2015 г. № 267. Зарегистрирован Минюстом России 1 сентября 2015 г. № 38757
39. | «Об утверждении Положения о функциональной подсистеме контроля за ядерно и радиационно опасными объектами единой государственной системы предупреждения и ликвидации чрезвычайных ситуаций» | Ростехнадзор, приказ от 28 июня 2021 г. № 236. Зарегистрирован Минюстом России 20 декабря 2021 г. № 66445
40. | «Об утверждении Методических рекомендаций по проведению инспекционных измерений и применению статистических методов при надзоре за учетом и контролем ядерных материалов» | Ростехнадзор, приказ от 21 сентября 2015 г. № 367

41.

«Об утверждении Методических рекомендаций по вопросам организации проведения экспертизы безопасности (экспертизы обоснования безопасности) видов деятельности в области использования атомной энергии в части учета и контроля ядерных материалов, радиоактивных веществ и радиоактивных отходов и их физической защиты в процессе лицензирования»

Ростехнадзор, приказ от 24 февраля 2016 г. № 71

42. | «Об утверждении Перечня продукции, которая подлежит обязательной сертификации и для которой устанавливаются требования, связанные с обеспечением безопасности в области использования атомной энергии» | Ростехнадзор, приказ от 21 июля 2017 г. № 277. Зарегистрирован Минюстом России 26 сентября 2017 г. № 48327
43. | «Об утверждении Методических рекомендаций по осуществлению надзора за обеспечением радиационной безопасности на объектах проведения геофизических исследований с использованием радиационных источников» | Ростехнадзор, приказ от 25 июля 2017 г. № 282
44. | «Об утверждении Методических рекомендаций по осуществлению надзора за обеспечением радиационной безопасности при эксплуатации радиоизотопных приборов» | Ростехнадзор, приказ от 25 июля 2017 г. № 283
45. | «Об утверждении перечня должностных лиц Федеральной службы по экологическому, технологическому и атомному надзору и ее территориальных органов, уполномоченных составлять протоколы об административных правонарушениях» | Ростехнадзор, приказ от 27 октября 2017 г. № 454. Зарегистрирован Минюстом России 22 ноября 2017 г. № 48971
46. | Инструкция по отчетности в сфере надзора за состоянием учета, контроля и физической защиты | Ростехнадзор, приказ от 26 июня 2020 г. № 244
47. | Положение об отчетности в Федеральной службе по экологическому, технологическому и атомному надзору | Ростехнадзор, приказ от 6 марта 2018 г. № 101

48.

«Об определении организации научно-технической поддержки Федеральной службы по экологическому, технологическому и атомному надзору, осуществляющей проведение экспертизы программ для электронных вычислительных машин, используемых для построения расчетных моделей процессов, влияющих на безопасность объектов использования атомной энергии и (или) видов деятельности в области использования атомной энергии»

Ростехнадзор, приказ от 20 сентября 2018 г. № 450

49. | «Об утверждении примерного должностного регламента федерального государственного гражданского служащего Федеральной службы по экологическому, технологическому и атомному надзору» | Ростехнадзор, приказ от 16 апреля 2018 г. № 174. Зарегистрирован Минюстом России 8 мая 2018 г., № 51023
50. | «Об утверждении Порядка экспертизы программы для электронных вычислительных машин, используемой для построения расчётных моделей процессов, влияющих на безопасность объектов использования атомной энергии и (или) видов деятельности в области использования атомной энергии» | Ростехнадзор, приказ от 30 июля 2018 г. № 325 Зарегистрирован Минюстом России 12 ноября 2018 г., № 52650
51. | Методические рекомендации по осуществлению надзора за обеспечением радиационной безопасности при эксплуатации гамма-терапевтических аппаратов | Ростехнадзор, приказ от 18 сентября 2018 г. № 448
52. | Методические рекомендации по осуществлению надзора за обеспечением радиационной безопасности при эксплуатации приборов неразрушающего контроля, содержащих радиоактивные вещества (гамма-дефектоскопов) | Ростехнадзор, приказ от 25 сентября 2018 г. № 458
53. | Методические рекомендации по осуществлению надзора за обеспечением радиационной безопасности при эксплуатации радиационных источников, в составе которых содержатся открытые радионуклидные источники и (или) радиоактивные вещества | Ростехнадзор, приказ от 24 декабря 2020 г. № 565
54. | «Об утверждении Методики разработки нормативов допустимых сбросов радиоактивных веществ в водные объекты для водопользователей» | Ростехнадзор, приказ от 22 декабря 2016 г. № 551. Зарегистрирован Минюстом России 15 февраля 2017 г., № 45652
55. | «Об утверждении Порядка и формы ведения реестра выданных разрешений на выбросы радиоактивных веществ в атмосферный воздух и разрешений на сбросы радиоактивных веществ в водные объекты» | Ростехнадзор, приказ от 14 мая 2019 г. № 182. Зарегистрирован Минюстом России 30 сентября 2019 г., № 56087
56. | «Об утверждении Порядка проведения экспертизы проекта нормативов допустимых выбросов радиоактивных веществ в атмосферный воздух, проекта нормативов допустимых сбросов радиоактивных веществ в водные объекты» | Ростехнадзор, приказ от 14 мая 2019 г. № 183. Зарегистрирован Минюстом России 30 сентября 2019 г., № 56088

57.

«Об утверждении Методики определения размера платы за оказание необходимой и обязательной услуги по проведению экспертизы проекта нормативов допустимых выбросов радиоактивных веществ в атмосферный воздух и (или) проекта нормативов допустимых сбросов радиоактивных веществ в водные объекты на предмет их разработки в соответствии с пунктом 26 Правил разработки и установления нормативов допустимых выбросов радиоактивных веществ, нормативов допустимых сбросов радиоактивных веществ, а также выдачи разрешений на выбросы радиоактивных веществ, разрешений на сбросы радиоактивных веществ, утвержденных постановлением Правительства Российской Федерации от 26 июня 2018 г. N 731 "О нормативах допустимых выбросов радиоактивных веществ и нормативах допустимых сбросов радиоактивных веществ, а также о выдаче разрешений на выбросы радиоактивных веществ, разрешений на сбросы радиоактивных веществ", и предельного размера платы за оказание указанной услуги»

Ростехнадзор, приказ от 14 мая 2019 г. № 184. Зарегистрирован Минюстом России 6 августа 2019 г., № 55499

58.

Инструкция о порядке подготовки, структуре и содержании раздела «Контроль и надзор за обеспечением физической защиты ядерных установок, радиационных источников, ядерных материалов, радиоактивных веществ и пунктов хранения» годового отчета Федеральной службы по экологическому, технологическому и атомному надзору

Ростехнадзор, приказ от 1 июня 2018 г. № 238

59. | «Об утверждении формы и порядка ведения журнала постоянного государственного надзора на объектах использования атомной энергии». | Ростехнадзор, приказ от 15 июня 2012 г. № 341. Зарегистрирован Минюстом России 30 июля 2012 г. № 25037

12. Руководящие документы
№ п/п | Наименование документа | Федеральный орган исполнительной власти, принявший документ, дата и номер
1. | Типовая программа проверки системы учета и контроля ядерных материалов в организации | Ростехнадзор, приказ от 4 сентября 2020 г. № 335
2. | Инструкция о порядке проведения целевой инспекции физической защиты объектов использования атомной энергии. РД-07-04-2006 | Ростехнадзор, приказ от 27 ноября 2006 г. № 1031
3. | Инструкция об организации обучения работников Федеральной службы по экологическому, технологическому и атомному надзору по вопросам надзора за учетом, контролем и физической защитой ядерных материалов, радиоактивных веществ и радиоактивных отходов. РД-07-06-2006 | Ростехнадзор, приказ от 13 декабря 2006 г. № 1083
4. | Положение о рассмотрении документов, обосновывающих обеспечение ядерной и радиационной безопасности базового проекта блока атомной станции. РД-04-04-2007 | Ростехнадзор, приказ от 13 декабря 2007 г. № 857
5. | Инструкция о порядке информационного обеспечения деятельности Федеральной службы по экологическому, технологическому и атомному надзору. РД-22-06-2007 | Ростехнадзор, приказ от 29 декабря 2007 г. № 927
6. | Типовая программа инспекции при проведении государственного строительного надзора на объектах использования атомной энергии. РД-11-08-2008 | Ростехнадзор, приказ от 16 июня 2008 г. № 414
7. | Методические указания о порядке проведения оперативной инспекции состояния учета и контроля ядерных материалов. РД-07-15-2008 | Ростехнадзор, приказ от 7 июля 2008 г. № 472
8. | Методические указания о порядке осуществления надзора за соблюдением требований федеральных норм и правил в области использования атомной энергии и условий действия лицензий при сооружении объектов использования атомной энергии. РД-04-05-2008 | Ростехнадзор, приказ от 30 октября 2008 г. № 859
9. | Положение о надзоре за обеспечением физической защиты радиационных источников, радиоактивных веществ и радиоактивных отходов. РД-07-17-2008 | Ростехнадзор, приказ от 14 ноября 2008 г, № 892

Приложение

к разделу II Перечня нормативных правовых актов и нормативных документов, относящихся к сфере деятельности Федеральной службы по экологическому, технологическому и атомному надзору, утвержденному приказом Федеральной службы по экологическому, технологическому и атомному надзору от 4 февраля 2022 г. № 33 (справочное).

Нормативные правовые и нормативные акты, утвержденные другими федеральными органами исполнительной власти и организациями

1. Нормативные документы, утвержденные другими органами государственного регулирования безопасности
№ п/п | Наименование документа | Федеральный орган исполнительной власти, утвердивший документ, дата и номер
Санитарные нормы, правила и гигиенические нормативы
1. | Санитарные правила ликвидации, консервации и перепрофилирования предприятий по добыче и переработке радиоактивных руд. СП ЛКП-91 № 60028-91 | Минздрав СССР, Минатомэнергопром СССР, 1991 г.
2. | Правила радиационной безопасности при эксплуатации атомных станций (ПРБ АС-99). СП 2.6.1.28-2000 | Заместитель Главного государственного санитарного врача Российской Федерации по специальным вопросам, 15 декабря 2000 г.
3. | Гигиенические требования к проектированию предприятий и установок атомной промышленности (СПП ПУАП-03). СанПин 2.6.1.07-03 | Главный государственный санитарный врач Российской Федерации постановление от 4 февраля 2003 г. № 6. Зарегистрировано Минюстом России 3 апреля 2003 г. № 4365
4. | Гигиенические требования к использованию закрытых радионуклидных источников ионизирующего излучения при геофизических работах на буровых скважинах. СанПиН 2.6.1.1202-03 | Главный государственный санитарный врач Российской Федерации, постановление от 12 марта 2003 г. № 17. Зарегистрировано Минюстом России 25 марта 2003 г. № 4315
5. | Санитарные правила по радиационной безопасности персонала и населения при транспортировании радиоактивных материалов (веществ). СанПиН 2.6.1.1281-03 | Главный государственный санитарный врач Российской Федерации, Постановление от 17 апреля 2003 г. № 54. Зарегистрировано Минюстом России от 13 мая 2003 г. № 4529
6. | Гигиенические требования к проектированию и эксплуатации ядерных реакторов исследовательского назначения СП ИР-03. СанПин 2.6.1.23-03 | Главный государственный санитарный врач Российской Федерации, постановление от 28 апреля 2003 г. № 67. Зарегистрировано Минюстом России 20 мая 2003 г. № 4572
7. | Санитарные правила проектирования и эксплуатации атомных станций СП АС-03. СанПин 2.6.1. 24-03 | Главный государственный санитарный врач Российской Федерации, постановление от 28 апреля 2003 г. № 69. Зарегистрировано Минюстом России 26 мая 2003 г. № 4593
8. | Обеспечение радиационной безопасности предприятий ОАО «ТВЭЛ» (СП ТВЭЛ-03). СанПиН 2.6.1.34-03 | Главный государственный санитарный врач Российской Федерации, постановление от 5 мая 2003 г. № 90. Зарегистрировано Минюстом России 3 июня 2003 г. № 4634
9. | Гигиенические требования по обеспечению радиационной безопасности при проведении лучевой терапии с помощью открытых радионуклидных источников. СанПиН 2.6.1.2368-08 | Главный государственный санитарный врач Российской Федерации, постановление от 16 июня 2008 г. № 38. Зарегистрировано Минюстом России 9 июля 2008 г. № 11955
10. | Нормы радиационной безопасности НРБ-99/2009. СП 2.6.1.2523-09 | Главный государственный санитарный врач Российской Федерации, постановление от 7 июля 2009 г. № 47. Зарегистрировано Минюстом России 14 августа 2009 г. № 14534
11. | Основные санитарные правила обеспечения радиационной безопасности ОСПОРБ-99/2010. СП 2.6.1.2612-10 | Главный государственный санитарный врач Российской Федерации, постановление от 26 апреля 2010 г. № 40. Зарегистрировано Минюстом России 11 августа 2010 г. № 18115
12. | Гигиенические требования по обеспечению радиационной безопасности при радионуклидной дефектоскопии. СанПиН 2.6.1.3241-14 | Главный государственный санитарный врач Российской Федерации, постановление от 24 декабря 2014 г. № 89. Зарегистрировано Минюстом России 26 февраля 2015 г. № 36220
13. | Санитарно-эпидемиологические требования к обращению с радиоизотопными приборами и их устройству. Санитарные правила. СанПиН 2.6.1.3287- 15 | Главный государственный санитарный врач Российской Федерации, постановление от 14 июля 2015 г. № 27. Зарегистрировано Минюстом России 13 августа 2015 г. № 38518
14. | Санитарные правила. Общие вопросы. Организация и проведение производственного контроля за соблюдением Санитарных правил и выполнением санитарно-противоэпидемиологических (профилактических) мероприятий. СП 1.1.1058-01 | Главный государственный санитарный врач Российской Федерации, постановление от 13 июля 2001 г. № 18. Зарегистрировано Минюстом России 30 октября 2001 г. № 3000
15. | Гигиенические требования по обеспечению радиационной безопасности при обращении с источниками, генерирующими рентгеновское излучение при ускоряющем напряжении до 150 кВ. СанПиН 2.6.1-3289-15 | Главный государственный санитарный врач Российской Федерации, постановление от 20 июля 2015 г. № 32. Зарегистрировано Минюстом России 14 августа 2015 г. № 38534
Нормативные документы по пожарной безопасности
1. | Перечень зданий, сооружений, помещений и оборудования, подлежащих защите автоматическими установками пожаротушения и автоматической пожарной сигнализацией. НПБ 110-03 | МЧС России, приказ от 18 июня 2003 г. № 315. Зарегистрирован Минюстом России 27 июня 2003 г. № 4836
2. | Системы оповещения и управления эвакуацией людей при пожарах в зданиях и сооружениях. НПБ 104-03 | МЧС России, приказ от 20 июня 2003 г. № 323. Зарегистрирован Минюстом России 27 июня 2003 г. № 4837
3. | Пожарная безопасность атомных станций. Общие требования (НПБ 113-03) | МЧС России, приказ от 9 июня 2003 г. № 300 (письмом Минюста России от 27 июня 2003 г. № 07/6504 ЮД признан не нуждающимся в государственной регистрации).
4. | Определение категорий помещений, зданий и наружных установок по взрывопожарной и пожарной опасности. СП 12.13130.2009 | МЧС России, приказ от 25 марта 2009 г. № 182
5. | Свод правил «Система оповещения и управления эвакуацией людей при пожаре (СП 3.13130.2009) | МЧС России, приказ от 25 марта 2009 г. № 173
6. | Свод правил «Атомные станции. Требования пожарной безопасности» (СП 13.13130.2009) | МЧС России, приказ от 7 сентября 2009 г. № 515
2. Нормативные документы, утвержденные другими федеральными органами исполнительной власти, органами государственного управления при использовании атомной энергии и организациями
1. | Положение о проведении консервации строительства энергоблоков атомных станций | Минатомэнергопром СССР, 1992 г. Согласовано с Госатомнадзором России
2. | Нормы расчета на прочность транспортных упаковочных комплектов для перевозки ядерных делящихся материалов. НРП-93 | Минатом России, приказ от 14 января 1993 г.
3. | Положение о взаимодействии в системах физической защиты ядерно-опасных объектов Минатома России | Минатом России, приказ от 28 июня 2000 г. № 387
4. | Положение о лаборатории психофизиологического обеспечения объекта использования атомной энергии. РД ЭО-0159-99 | Минатом России, приказ от 30 августа 2000 г. № 532
5. | «Об утверждении Положения об общих требованиях к системе физической защиты ядерно-опасных объектов Минатома России» | Минатом России, приказ от 10 октября 2001 г. № 550
6. | Системы физической защиты ядерных материалов и установок. Требования к проектным решениям. ОСТ 95 10595-2002 | Минатом России, приказ от 26 апреля 2002 г. № 211
7. | Положение об организации работ по ликвидации последствий аварий при перевозке ядерных материалов и радиоактивных веществ федеральным железнодорожным транспортом. ПЛА-2001 | Минатом России, МПС России, приказ от 15 февраля 2002 г. № 78/5
8. | Подготовка и проведение противоаварийных тренировок персонала атомных станций. Основные требования. СТО 1.1.1.01.004.0469-2008 | ФГУП концерн «Росэнергоатом», приказ от 1 сентября 2008 г. № 775
9. | «Об утверждении документации по защите информации в системах физической защиты ядерно-опасных объектов» | Госкорпорация «Росатом», приказ от 8 августа 2011 г. № 1/669-П
10. | Порядок организации охраны объектов ведомственной охраной Государственной корпорации по атомной энергии «Росатом» | Госкорпорация «Росатом», приказ от 24 февраля 2012 г. № 1/150-П-ДСП
11. | «Об утверждении метрологических требований к измерениям, эталонам единиц величин, стандартным образцам, средствам измерений, их составным частям, программному обеспечению, методикам (методам) измерений, применяемым в области использования атомной энергии» | Госкорпорация «Росатом», приказ от 31 октября 2013 г. № 1/10-НПА. Зарегистрирован Минюстом России 27 февраля 2014 г. № 31442
12. | Единые отраслевые методические указания по проведению консервации объектов капитального строительства инвестиционной программы ОАО «Концерн Росэнергоатом» | Госкорпорация «Росатом», приказ от 23 ноября 2015 г. № 1/1116-П

13.

«Об утверждений форм отчетов организаций в области государственного учета и контроля радиоактивных веществ, радиоактивных отходов и ядерных материалов, не подлежащих учету в системе государственного учета и контроля ядерных материалов, активность которых больше или равна минимально значимой активности и удельная активность которых больше или равна минимально значимой удельной активности, установленной федеральными нормами и правилами в области использования атомной энергии, порядка и сроков их представления»

Госкорпорация «Росатом», приказ от 7 декабря 2020 г. № 1/13-НПА. Зарегистрирован Минюстом России 14 мая 2021 г., № 63429

14. | Основные правила ядерной безопасности при производстве, переработке, хранении и транспортировании ядерно-опасных делящихся материалов (ПБЯ-06-00-2016). СТО 95 12001-2016 |  Госкорпорация «Росатом», приказ от 10 ноября 2016 г. № 1/1093-П
15. | Правила ядерной безопасности при хранении и транспортировании ядерных делящихся материалов (ПБЯ-06-09-2016). СТО 95 12002-2016 | Госкорпорация «Росатом», приказ от 26 ноября 2016 г. № 1/1322-П
16. | Основные правила обеспечения эксплуатации атомных станций. СТО 1.1.1.01.0678-2015 | АО «Концерн Росэнергоатом», приказ от 25 декабря 2016 г. № 9/1483-П
17. | Правила ядерной безопасности при хранении и транспортировании твэлов и ТВС промышленных реакторов (ПБЯ-06-07-2016). СТО 95 12003-2016 | Госкорпорация «Росатом», приказ от 9 января 2017 г.  № 1/1-П
18. | Правила ядерной безопасности для производства тепловыделяющих элементов (ПБЯ-06-01-2017). СТО 95 12018-2017 | Госкорпорация «Росатом», приказ от 15 июня 2017 г. № 1/526-П-ДСП
19. | Общие правила проектирования и эксплуатации систем аварийной сигнализации о возникновении самоподдерживающейся цепной ядерной реакции деления и организации мероприятий по ограничению ее последствий ПБЯ-06-10-2017. СТО 95 12004-2017 | Госкорпорация «Росатом», приказ от 24 апреля 2017 г. № 1/354-П
20. | Инструкция по обеспечению физической защиты ядерных материалов I и II категории и ядерных установок на их основе при межобъектовых перевозках и транспортировании | Госкорпорация «Росатом», приказ от 23 января 2018 г. № 1/64-П-ДСП
21. | «Об утверждении РД 31.2.01-2001 «Положение об обеспечении физической защиты судов с ядерными энергетическими установками и судов атомно-технологического обслуживания» | Минтранс России, распоряжение от 2 августа 2001 г. № ВР-69-р
22. | «Об утверждении Порядка выдачи специального разрешения на движение по автомобильным дорогам транспортного средства, осуществляющего перевозки опасных грузов» | Минтранс России, приказ от 12 августа 2020 г. № 304. Зарегистрирован Минюстом России 15 декабря 2020 г., № 61472
23. | «Об утверждении Порядка выдачи свидетельств о подготовке водителей автотранспортных средств, перевозящих опасные грузы, и утверждения курсов такой подготовки» | Минтранс России, приказ от 30 июля 2020 г. № 265. Зарегистрирован Минюстом России 13 ноября 2020 г., № 60894.
24. | Правила классификации и постройки судов атомно-технологического обслуживания | Российский морской регистр судоходства, 2017 г.
25. | Правила классификации и постройки атомных судов и плавучих сооружений | Российский морской регистр судоходства, 2018 г.
26. | Правила технической эксплуатации атомных судов и судов атомно-технологического обслуживания. Основное руководство. РД 31.20.40-04 | Росморречфлот, 2004 г.
27. | Концепция физической защиты ядерных материалов и ядерных установок на предприятиях Минэкономики России | Минэкономики России, 1998 г.
28. | «Об утверждении Единого квалификационного справочника должностей руководителей, специалистов и служащих, раздел «Квалификационные характеристики должностей работников организаций атомной энергетики» | Минздравсоцразвития России, приказ от 10 декабря 2009 г. № 977
29. | Типовая инструкция по ведению локальных испытаний плотности проходок, запорной арматуры технологических систем, люков, дверей и другого герметизирующего оборудования систем локализации аварий на АС с ВВЭР-1000. ТИ 1Л-84 | Минэнерго СССР, 1984 г., согласована с Госатомэнергонадзором СССР
30. | Типовая инструкция по ведению локальных испытаний плотности проходок, запорной арматуры технологических систем, люков, дверей и другого герметизирующего оборудования систем локализации аварий на АС с ВВЭР-440. ТИ 2Л-84 | Минэнерго СССР, 1984 г., согласована с Госатомэнергонадзором СССР
31. | Типовая инструкция по ведению локальных испытаний плотности проходок, запорной арматуры технологических систем, люков, дверей и другого герметизирующего оборудования систем локализации аварий на АС с РБМК-1000. ТИ 3Л-84. | Минэнерго СССР, 1984 г., согласована с Госатомэнергонадзором СССР
32. | Правила устройства электроустановок (ПУЭ) изд. 6-е и изд. 7-е, разделы 6, 7 | Минэнерго России, приказ от 8 июля 2002 г. № 204
33. | «Об утверждении Правил технической эксплуатации электроустановок потребителей» | Минэнерго России, приказ от 13 января 2003 г. № 6. Зарегистрирован Минюстом России 22 января 2003 г., № 4145
34. | Реакторы ядерные. Организационно-технический порядок разработки и постановки на производство активных зон и их составных частей. СТК-5-2005 | ОАО «ТВЭЛ», приказ от 16 ноября 2005 г. № 92
35. | Источники ионизирующего излучения радионуклидные закрытые. Термины и определения. ГОСТ 25504-82 | Государственный комитет СССР по стандартам, постановление от 11 ноября 1982 г. № 4269
36. | Источники ионизирующего излучения радионуклидные закрытые. Классы прочности и методы испытаний. ГОСТ Р 52241-2004. | Госстандарт России, постановление от 9 марта 2004 г. № 106-ст
37. | Радиоактивное вещество особого вида. Общие технические требования и методы испытаний. ГОСТ Р 50629-93 | Госстандарт России, постановление от 28 декабря 1993 г. № 283
38. | Источники закрытые радиоактивные. Общие положения. ГОСТ Р 50830-95 | Госстандарт России, постановление от 25 октября1995 г. № 552
39. | Мониторы радиационные ядерных материалов. Общие технические условия. ГОСТ Р 51635-2000 | Госстандарт России, постановление от 3 августа 2000 г. № 200-ст
40. | Источники ионизирующего излучения радионуклидные закрытые. Общие технические требования. ГОСТ Р 51873-2002 | Госстандарт России, постановление от 28 февраля 2002 г. № 81-ст
41. | Устройства запорно-пломбировочные для транспорта и контейнеров общего и специального назначения. Общие технические требования. ГОСТ 31281-2004 | Росстандарт, приказ от 16 июня 2005 г. № 160-ст
42. | Устройство пломбировочное. Классификация. ГОСТ 31282-2004 | Росстандарт, приказ от 16 июня 2005г. №158-ст
43. | Пломбы индикаторные. Общие технические требования. ГОСТ 31283-2004 | Росстандарт, приказ от 16 июня 2005 г. № 159-ст
44. | Устройства пломбировочные. Состав и требования к системам пломбирования. ГОСТ 52525-2019 | Росстандарт, приказ от 3 сентября 2019 г. № 624-ст
45. | Устройства пломбировочные. Порядок контроля состояния пломбировочных устройств в процессе эксплуатации. ГОСТ 53418-2009 | Росстандарт, приказ от 26 октября 2009 г. № 481-ст
46. | Устройства пломбировочные электронные. Общие технические требования. ГОСТ 31315-2015 | Росстандарт, приказ от 1 апреля 2016 г. № 234-ст
47. | Устройства пломбировочные. Методы утилизации. ГОСТ 57117-2016 | Росстандарт, приказ от 6 октября 2016 г. № 1316-ст
48. | Система стандартов безопасности труда (ССБТ). Организация обучения безопасности труда. Общие положения. ГОСТ 12.0.004-2015 | Росстандарт, приказ от 9 июня 2016 г. № 600-ст
49. | Надежность в технике (ССНТ). Термины и определения. ГОСТ 27.002-2015 | Росстандарт, приказ от 21 июня 2016 г. № 654-ст
50. | «Об утверждении профессионального стандарта «Механик судовой» | Минтруд России, приказ от 7 сентября 2020 г. № 576н Зарегистрирован Минюстом России 25 сентября 2020 г., № 60030
51. | Единый квалификационный справочник должностей руководителей, специалистов и служащих, раздел «Квалификационные характеристики должностей работников плавучих атомных станций» | Минтруд России, приказ от 18 июня 2014 г. № 384н
52. | «Об утверждении профессионального стандарта «Специалист атомно-механической службы судов с ядерными энергетическими установками, судов атомно-технологического обслуживания (всех категорий)» | Минтруд России, приказ от 4 августа 2014 г. № 529н
53. | «Об утверждении профессионального стандарта «Специалист по организации спецпроизводства в области атомного флота (всех специальностей, всех категорий)» | Минтруд России, приказ от 8 сентября 2014 г. № 618н
54. | «Об утверждении профессионального стандарта «Дозиметрист судов с ядерной энергетической установкой, судов атомно-технологического обслуживания (инженер всех категорий)» | Минтруд России, приказ от 31 октября 2014 г. № 858н
55. | «Об обязательной метрологической экспертизе в области использования атомной энергии» | Минпромторг России, Приказ от 29 мая 2017 г. № 1693. Зарегистрирован Минюстом России 26 июня 2017 г. № 47170
56. | «Об утверждении Порядка формирования и ведения перечня методик расчета выбросов вредных (загрязняющих) веществ в атмосферный воздух стационарными источниками» | Минприроды России, приказ от 31 июля 2018 г. № 341. Зарегистрирован Минюстом России 23 октября 2018 г., № 52502.

57.

«Об установлении требований к сбору, обработке, хранению, предоставлению, распространению информации о радиационной обстановке, содержащейся в единой государственной автоматизированной системе мониторинга радиационной обстановки на территории Российской Федерации и ее функциональных подсистемах, а также к обмену информацией о радиационной обстановке»

Минприроды России, приказ от 6 декабря 2016 г. № 638. Зарегистрирован Минюстом России 9 января 2017 г., № 45106.

58.

«Об утверждении требований к проведению медицинских осмотров и психофизиологических обследований работников объектов использования атомной энергии, порядка их проведения, перечня медицинских противопоказаний для выдачи разрешения на выполнение определенных видов деятельности в области использования атомной энергии и перечня должностей работников объектов использования атомной энергии, на которые распространяются данные противопоказания, а также формы медицинского заключения о наличии (отсутствии) медицинских противопоказаний для выдачи разрешения на выполнение определенных видов деятельности в области использования атомной энергии»

Минздрав России, приказ от 28 июля 2020 г. № 749н. Зарегистрирован Минюстом России 11 сентября 2020 г., № 59782.

59. | Устройства пломбировочные. Учет, контроль и утилизация. ГОСТ Р 52326-2019 | Росстандарт, приказ от 3 сентября 2019 г. № 621-ст